\begin{table}%t1
%\centering
\par
\caption{\label{lftab}$B$-band luminosity and mass function parameters.}
\begin{tabular}{lcccccccc}
\hline\hline \noalign{\smallskip}
Sample selection & $x_{1}$ & $x_{2}$ & $M^{*}_0$ & $\delta$ & $\phi_0$ & $\gamma$ & $\alpha_0$ & $\psi$\\
\hline
$M_B$		& 0.4 & 0.4  & --21.07 & --1.23 & --2.46 & --0.12 & --1.30 & 0\\
$M_{\star}$	&   1 & --1 &  11.23 &  0.13 & --2.72 & --0.56 & --1.22 & --0.041\\
\hline
\end{tabular}
\tablefoot{See Eq.~(\ref{lfunc}) for details about the meaning of each parameter.}
\end{table}