\begin{table}%t3
%\centering
\par
\caption{\label{tab_gf_si}Comparison of the weighted oscillator strength $gf$ between the AS and other calculations for Si$^{4+}$.} 
\par
\begin{tabular}{cccccc}
\hline\hline\noalign{\smallskip}
$i-j$  &   \multicolumn{2}{c}{AS} &  {\rm CHIANTI\tablefootmark{a}} &   {\rm FAC}  &   {\rm MCHF\tablefootmark{b}} \\
             &  $gf_L$  &$gf_V/gf_L$     &   & &  \\
\hline\noalign{\smallskip}
     1--3 & 2.19$^{-2}$$^c$&  0.89  &  2.36$^{-2}$ & 2.09$^{-2}$ &  2.44$^{-2}$ \\
     1--5 & 2.33$^{-1}$    &  0.92  &  2.82$^{-1}$ & 2.68$^{-1}$ &  2.18$^{-1}$ \\
     1--17 & 2.63$^{-3}$    &  0.94  &  2.62$^{-3}$ & 2.56$^{-3}$ &  2.98$^{-3}$ \\
     1--24 & 7.97$^{-2}$    &  0.95  &  6.54$^{-2}$ & 6.23$^{-2}$ &  1.03$^{-1}$ \\
     1--27 & 1.17$^{+0}$    &  0.96  &  1.46$^{+0}$ & 1.25$^{+0}$ &  1.02$^{+0}$ \\
     2--6 & 3.58$^{-1}$    &  0.86  &  4.25$^{-1}$ & 3.49$^{-1}$ &  3.55$^{-1}$ \\
     2--7 & 1.59$^{+0}$    &  0.97  &  1.54$^{+0}$ & 1.58$^{+0}$ &  1.55$^{+0}$ \\
     2--8 & 4.24$^{-1}$    &  0.93  &  4.28$^{-1}$ & 4.27$^{-1}$ &  4.21$^{-1}$ \\
     2--9 & 6.08$^{-2}$    &  0.89  &  5.80$^{-2}$ & 5.89$^{-2}$ &  6.13$^{-2}$ \\
     2--10 & 5.00$^{-1}$    &  0.81  &  4.89$^{-1}$ & 5.20$^{-1}$ &  5.16$^{-1}$ \\
     2--11 & 6.09$^{-2}$    &  0.78  &  5.10$^{-2}$ & 5.94$^{-2}$ &  4.34$^{-2}$ \\
     2--12 & 2.91$^{-1}$    &  0.75  &  2.00$^{-1}$ & 2.63$^{-1}$ &  2.45$^{-1}$ \\
     2--14 & 1.49$^{-1}$    &  0.79  &  1.27$^{-1}$ & 1.55$^{-1}$ &  1.55$^{-1}$ \\
     3--6 & 1.42$^{-1}$    &  0.87  &  1.63$^{-1}$ & 1.43$^{-1}$ &  1.37$^{-1}$ \\
     3--8 & 6.92$^{-1}$    &  0.99  &  6.52$^{-1}$ & 6.83$^{-1}$ &  6.71$^{-1}$ \\
     3--9 & 4.06$^{-1}$    &  0.94  &  3.92$^{-1}$ & 3.91$^{-1}$ &  4.05$^{-1}$ \\
     3--10 & 1.88$^{-1}$    &  0.84  &  2.34$^{-1}$ & 2.08$^{-1}$ &  2.27$^{-1}$ \\
     3--11 & 5.58$^{-2}$    &  0.79  &  4.27$^{-2}$ & 5.59$^{-2}$ &  4.59$^{-2}$ \\
     3--12 & 2.78$^{-1}$    &  0.82  &  2.18$^{-1}$ & 2.61$^{-1}$ &  2.30$^{-1}$ \\
     3--13 & 2.34$^{-1}$    &  0.80  &  2.17$^{-1}$ & 2.36$^{-1}$ &  2.27$^{-1}$ \\
     3--14 & 4.86$^{-2}$    &  0.72  &  5.34$^{-2}$ & 5.59$^{-2}$ &  5.05$^{-2}$ \\
     3--15 & 2.77$^{-2}$    &  0.66  &  4.09$^{-2}$ & 2.42$^{-2}$ &  2.60$^{-2}$ \\
     4--6 & 3.98$^{-2}$    &  0.87  &  4.51$^{-2}$ & 3.86$^{-2}$ &  3.82$^{-2}$ \\
     4--9 & 2.13$^{-1}$    &  1.02  &  1.99$^{-1}$ & 2.24$^{-1}$ &  1.96$^{-1}$ \\
     4--11 & 2.37$^{-1}$    &  0.88  &  2.27$^{-1}$ & 2.07$^{-1}$ &  2.13$^{-1}$ \\
     4--14 & 1.98$^{-1}$    &  0.80  &  1.95$^{-1}$ & 2.12$^{-1}$ &  2.22$^{-1}$ \\
     5--6 & 5.06$^{-3}$    &  0.81  &  4.86$^{-3}$ & 3.81$^{-3}$ &  5.84$^{-3}$ \\
     5--8 & 1.46$^{-2}$    &  1.04  &  7.84$^{-3}$ & 1.39$^{-2}$ &  9.49$^{-3}$ \\
     5--9 & 1.23$^{-3}$    &  1.03  &  1.68$^{-3}$ & 7.85$^{-4}$ &  1.66$^{-3}$ \\
     5--10 & 4.89$^{-1}$    &  1.02  &  3.05$^{-1}$ & 4.50$^{-1}$ &  4.13$^{-1}$ \\
     5--11 & 3.39$^{-1}$    &  0.99  &  3.11$^{-1}$ & 3.65$^{-1}$ &  3.73$^{-1}$ \\
     5--12 & 6.25$^{-1}$    &  0.96  &  7.63$^{-1}$ & 6.61$^{-1}$ &  6.83$^{-1}$ \\
     5--13 & 1.39$^{-2}$    &  0.84  &  1.24$^{-2}$ & 1.14$^{-2}$ &  1.44$^{-2}$ \\
     5--14 & 3.24$^{-1}$    &  0.92  &  2.83$^{-1}$ & 2.96$^{-1}$ &  2.79$^{-1}$ \\
     5--15 & 3.80$^{-1}$    &  0.68  &  5.80$^{-1}$ & 3.96$^{-1}$ &  3.31$^{-1}$ \\
  \hline
\end{tabular}\vspace*{-2mm}
\tablefoot{Index number corresponds to that in Table~\ref{tab_energy_si}.\tablefoottext{a}{Data in CHIANTI are from the work of Bhatia et~al. (1985).} \tablefoottext{b}{MCHF data is from the website: \protect\url{http://atoms.vuse.vanderbilt.edu/}} \tablefoottext{c}{$x^y$ denotes $x\times10^y$.}}\vspace*{-3.5mm}
\end{table}