\begin{table}%t1
%\centering
\par
\caption{\label{table: source-stat}Statistics of the sources.}
\begin{tabular}{*{4}{lll}}
\hline\hline
 \T Redshift & Total & PN net counts & Total \\
 bin & sources & \B (2--10~keV) & Lbins \\ \hline
 \T 0.0--0.2 & 130 & 78~857 & 6\\
 0.2--0.3 & 42 & 33~896 & 2\\
 0.3--0.4 & 37 & 15~594  & 1\\
 0.4--0.6 & 47 & 24~349  & 2\\
 0.6--0.8 & 60 & 35~550  & 2\\
 0.8--1.0 & 33 & 14~502  & 2\\
 1.0--1.3 & 60 & 30~263 & 2 \\
 1.3--1.7 & 52 & 35~735 & 2\\
 1.7--2.1 & 12 & 5401 & 1\\
 2.1--2.5 & 15 & 9352 & 1\\
 2.5--3.0 & 6 & 5098 & 1\\
 3.0--4.0 & 4 & 6717 & 1\\
 4.0--5.0 & 9 & 12~611 & 1\\ 
 \hline
\end{tabular}
\end{table}