\begin{table}%t2
\caption{\label{tab:pos_coincidence2}0FGL sources with coincident MILAGRO source, but without plausible coincident reported VHE $\gamma$-ray sources. See Table~\ref{tab:pos_coincidence1} for the nomenclature.}
%\centering
\par
%\renewcommand{\footnoterule}{}  
\begin{tabular}{lccccccccc}
\hline\hline\noalign{\smallskip}
LAT source & Class & $l$ & $b$ & Error & MILAGRO source & $l$ & $b$ & Extension & References \\
               & & ($\degr$) & ($\degr$) & ($\degr$) & ($\degr$) & ($\degr$) & ($\degr$) &  \\
    \hline
    \object{0FGL~J0634.0$+$1745} & PSR & 195.16 & 4.29 & 0.04   & MGRO~C3       & 195.3 & 3.8 & 1.3 & \citet{milagro_bsl} \\
    \object{0FGL~J2020.8$+$3649} & PSR & 75.182 & 0.131 & 0.060 & \object{MGRO~J2019$+$37} & 74.8 & 0.4 & $\sim$0.1 & \citet{milagro_bsl} \\
    \hline
\end{tabular} 
\end{table}