\begin{table}%t3
%\centering
\par
\caption{\label{fl30m}IRAM~30m fluxes at 3~mm and 1~mm.}
\begin{tabular}{l c c c c} 
\hline\hline\noalign{\smallskip}
\textbf{Galaxy} &$S_{3~{\rm mm}}$	& $\delta S_{3~{\rm mm}}$	&$S_{1~{\rm mm}}$ & $\delta S_{1~{\rm mm}}$ \\
 & (mJy) & (mJy)	&(mJy) &	(mJy)	\\
\hline
$3CR 31$	& 79.07	& 1.13	& 74.39	& 2.78	\\
$3CR 40$	& 96.91	& 0.9	& 20.11	& 1.8 	\\
$3CR 66B$	& 110.12& 0.43	& 73.08	& 1.39	\\
$3CR 83.1$& 33.45	& 0.69	&  ...	& ... 	\\
$3CR 88$	& 121.84& 0.43	& 87.05	& 1.3	\\
$3CR 98$	& 18.09	& 0.52	& 6.18	& 1.54	\\
$3CR 129$	& 28.53	& 0.65	& 0.91	& 1.27	\\
$3CR 236$	& 225.06& 0.57	&  X	&  X	\\
$3CR 264$	& 174.64& 0.5	& 87.35	& 1.13	\\
$3CR 270$	& 326.34& 0.82	& 204.71& 1.57	\\
$3CR 272.1$&138.29& 1.2	& 73.86	& 6.79	\\
$3CR 274$	&2347.13& 1.83	&1312.31& 2.78 	\\
$3CR 296$	& 99.23	& 0.6	& 54.55	& 1.22	\\
$3CR 305$	& 21.23	& 4.28	&  X	&  X	\\
$3CR 321$	& 67.33	& 0.52	&  X	&  X	\\
$3CR 327$	& 105.81& 0.69	&  X	&  X	\\
$3CR 353$	& ...	& ...	& 3.46	& 1.35	\\
$3CR 386$	& 50.21	& 0.88	& 105.01& 2.26	\\
$3CR 402$	& 332.57& 39.27	& ...	& ...	\\
$3CR 403$	& 20.35	& 0.48	&  X	&  X	\\
$3CR 433$	& 91.29	& 0.76	&  X	&  X	\\
$3CR 442$	& 9.62	& 0.43	& 75.51	& 9.99	\\
$3CR 449$	& 25.82	& 0.5	& 15.83	& 1.65	\\
$3CR 465$	& 86.06	& 0.56	& 27.32	& 1.31	\\
$NGC 315$& 353.56& 0.67	& 62.12	& 1.39	\\
$NGC 326$& 63.47	& 0.63	& ...	& ...	\\
$NGC 541$& 4.73	& 2.02	& 27.23	& 2.60 	\\
$NGC 708$& 8.11	& 0.98	& 148.94& 3.83	\\
$NGC 2484$	& 110.63	& 0.69	& 11.92	& 1.65 	\\
$NGC 2892$	& 190.05	& 0.87	& 272.39& 2.23 	\\
$NGC 3801$	& 1181.72	& 210	& ...	& ... 	\\
$NGC 4278$	& 215.9		& 1.08	& 194.34& 1.28 	\\
$NGC 5127$	& 25.62		& 1.13	& ...	& ...	\\	
$NGC 5141$	& 63.50		& 1.01  & ...	& ... 	\\  
$NGC 5490$	& 27.72		& 1.44	& 88.61	& 5.46 	\\
$NGC 6251$	& 367.88	& 0.71	& X	& X 	\\
$NGC 7052$	& 85.51		& 12.13	& 18.77	& 1.49 	\\
$B2~0034+25$	& 72.97		& 0.68	& 190.81& 1.82	\\
$B2~0116+31$	& 164.53	& 1.22	& ...	& ...	\\
$B2~0648+27$	& 152.99	& 0.37	& 172.99& 2.09	\\
$B2~0836+29B$	& ...		& ...	& X	& X	\\
$B2~0915+32B$	& 11.39		& 1.29	& 24.41	& 2.17	\\
$B2~0924+30$	& 9.44		& 1.13	& ...	& ...	\\  
$B2~1101+38$	& 359.89	& 0.97	& 0.165	& 0.002	\\
$B2~1347+28$	& 8.96		& 0.51	& ...	& ...	\\
$B2~1357+28$	& ...		& ...	& ...	& ...	\\
$B2~1447+27$	& 13.94		& 0.53	& 52.41	& 0.81	\\
$B2~1512+30$	& ...		& ...	& ...	& ...	\\
$B2~1525+29$	& 14.48		& 1.07	& 0.13	& 0.003	\\
$B2~1553+24$	& 35.28		& 1	& ...	& ...	\\
$UGC7115$	& 30.57		& 1.03	& ...	& ...	\\
$OQ208$		& 40.43		& 16.67	& X	& X	\\ 
\hline
\end{tabular}
\tablefoot{X means that there was no data, and ``...'' refers to undetected flux.}
\end{table}