\begin{table}%t1
\caption{\label{wasp8-params}Stellar parameters of \wasps\ derived from spectroscopic \mbox{analysis}.}
%\centering
\par
\begin{tabular}{ll|cc}
\hline\hline                
&&& \\[-8pt]
\teff      & 5600 $\pm$ 80 K&{[Na/H]}   &  +0.22 $\pm$ 0.07 \\
\logg      & 4.5 $\pm$ 0.1 &{[Mg/H]}   &  +0.21 $\pm$ 0.04 \\
\mictrb    & 1.1 $\pm$ 0.1 \kms& {[Si/H]}   &  +0.29 $\pm$ 0.09 \\
\vsini     & 2.0 $\pm$ 0.6 \kms & {[Ca/H]}   &  +0.24 $\pm$ 0.12\\
{[Fe/H]}   &  +0.17 $\pm$ 0.07  &  {[Sc/H]}   &  +0.23 $\pm$ 0.05  \\
log A(Li/H)+12  & 1.5 $\pm$ 0.1&{[Ti/H]}   &  +0.24 $\pm$ 0.08  \\
&&{[V/H]}    &  +0.30 $\pm$ 0.08 \\
dist&87 $\pm$ $7$ pc&{[Cr/H]}   &  +0.17 $\pm$ 0.09 \\
age&3$-$5 Gyr&{[Co/H]}   &  +0.29 $\pm$ 0.07 \\
&&{[Ni/H]}   &  +0.23 $\pm$ 0.07 \\
\hline
\end{tabular}
\tablefoot {The quoted error estimates include those given by the uncertainties in \teff, \logg, and \mictrb, as~well as  atomic data uncertainties.}
\end{table}