\begin{table}%t6
\caption{\label{tab1258}A sinusoidal fit for the 1.2578-d period in the \ha emission RV \oc\ residuals.}
%%\centerline

{\small
\begin{tabular}{rcccccl}
\hline\hline
Element           &  Value \\
\noalign{\smallskip}\hline\noalign{\smallskip}
$P$ (d)           & 1.257805 ~\p ~0.000029 \\
$T_{\rm RV~max}$& 51808.812 ~\p~ 0.042 \\
$K$ (\ks)         & 0.52 ~\p~ 0.30       \\
rms (\ks)         & 0.869              \\
\noalign{\smallskip}\hline\noalign{\smallskip}
\end{tabular}}
\tablefoot{$K$ is the semiamplitude of the curve and rms is the rms error of one observation.}
\end{table}