\begin{table}%t9
\caption{\label{tfuller}Comparison between our $\delta V$ and the one derived by Fuller et~al. (\cite{fuller}) from HCO$^{+}$(1--0).}
\par
%\centering
\par
\begin{tabular}{lcccccc}
\hline \hline \noalign{\smallskip}
Source & $\delta V_{\rm fuller}$ & $\delta V_{\rm our}$\\
\hline
05358+3543 & +0.23 & +0.23\\
18151--1208\_1 & +0.02 & +0.19\\
18223--1243 & --0.31 & --0.19\\
18264--1152 & +0.10 & --0.06\\
19035+0641 & --0.11 & --0.07\\
20216+4107 & +0.03 & --0.03\\
22134+5834 & +0.66 & +0.48\\
23033+5951 & --0.07 & --0.04\\
23139+5939 & --0.27 & --0.10\\
\hline
\end{tabular}
\end{table}