\begin{table}%t3
\caption{Mean values and 1$\sigma$ errors for the cosmological parameters using all CMB data and the SDSS DR7 power spectrum.} \label{pcosmo}
\par
%{1.3}
%\centerline
{
\begin{tabular}{lc}
\hline
\hline
  Parameter &  All CMB + SDSS \\
\hline
 $\Omega_{\rm b} h^2$ & $\rm 0.02195_{-0.00068}^{+0.00067}$    \\
 $\Omega_{\rm CDM} h^2$ & $\rm 0.1070_{-0.0065}^{+0.0065}$    \\
$\tau$ & $\rm 0.087_{-0.007}^{+0.006}$    \\
$n_{\rm s}$ & $\rm 0.971_{-0.013}^{+0.013}$ \\
$A_{\rm s}$ & $\rm 3.097_{-0.036}^{+0.035}$ \\
$H_0$ &  $\rm 64.3_{-4.4}^{+4.3}$    \\
\hline
\end{tabular}}
\tablefoot{
  $H_0$ is in units of km s$^{-1}$ Mpc$^{-1}$.}
\end{table}