\begin{table}%t5
\caption{\label{abundFe}Iron abundances computed for all the rapid-rotating stars.} 
%%\centering

\par
\begin{tabular}{l r}                 
\hline            
\hline \noalign{\smallskip}           
HIP  & $\left[\epsilon {\rm (Fe)} \right]$ \\
\hline
91178 & 0.1~~ \\
92247 & 0.4~~ \\
92259 & 0.2~~ \\
93924 & 0.3~~ \\
94809 & 0.4~~ \\
95174 & $-$0.1~~ \\
95495 & 0.4~~ \\
95506 & 0.5~~ \\
96343 & 0.6~~ \\
96776 & 0.7~~ \\
97254 & 0.1~~ \\
97486 & 0.3~~ \\
97582 & 0.2~~ \\
97724 & $-$0.2~~ \\
98160 & $-$0.1~~ \\
98814 & 0.2~~ \\
\hline
\end{tabular} 
\tablefoot{Typical errors are on the order of 0.2 dex.}
\end{table}