\begin{table}%t2
\caption{\label{t2}Linelist. ``HFS'' indicates that hyperfine splitting was taken into account for these transitions.}
%\centering
\par
\begin{tabular}{cccrrcccrr}          
\hline
\hline\noalign{\smallskip}
& $\lambda$ & E.P. &  & $EW$ [m\AA] & & $\lambda$ & E.P. &  & $EW$ [m\AA]  \\
\raisebox{1.5ex}[-1.5ex]{Element} & [\AA] & [eV]  & \raisebox{1.5ex}[-1.5ex]{log~$gf$} & (RGB) & 
\raisebox{1.5ex}[-1.5ex]{Element} & [\AA] & [eV]  & \raisebox{1.5ex}[-1.5ex]{log~$gf$} & (RGB) \\
\hline
Mg  I & 5528.42 &  4.35 & $-$0.357 & 177 & Cr  I & 5300.75 &  0.98 & $-$2.120 &  113 \\ 
Mg  I & 5711.09 &  4.33 & $-$1.728 & 108 & Cr  I & 5329.14 &  2.91 & $-$0.064 &   79 \\ 
Al  I & 6696.03 &  3.14 & $-$1.347 &  36 & Cr  I & 5345.81 &  1.00 & $-$0.980 &  165 \\ 
Si  I & 5684.48 &  4.95 & $-$1.650 &  33 & Cr  I & 5348.33 &  1.00 & $-$1.290 &  144 \\ 
Si  I & 5708.41 &  4.95 & $-$1.470 &  88 & Cr  I & 6330.09 &  0.94 & $-$2.914 &   50 \\ 
Si  I & 5948.55 &  5.08 & $-$1.230 &  64 & Mn  I$^{\rm HFS}$ & 5394.63 &  0.00 & $-$3.503 &  166 \\ 
Si  I & 6142.48 &  5.62 & $-$0.920 &  22 & Mn  I$^{\rm HFS}$ & 5432.51 &  0.00 & $-$3.800 &  136 \\ 
Si  I & 6155.13 &  5.61 & $-$0.750 &  64 & Mn  I$^{\rm HFS}$ & 6013.48 &  3.07 & $-$0.251 &  102 \\ 
Ca  I & 5261.71 &  2.52 & $-$0.580 & 107 & Mn  I$^{\rm HFS}$ & 6016.62 &  3.08 & $-$0.216 &  111 \\ 
Ca  I & 5590.13 &  2.52 & $-$0.570 & 114 & Mn  I$^{\rm HFS}$ & 6021.75 &  3.08 &	0.034 &   93 \\ 
Ca  I & 5601.29 &  2.53 & $-$0.520 & 116 & Fe  I & 4903.32 &  2.88 & $-$0.926 &  171 \\ 
Ca  I & 5857.46 &  2.93 &    0.230 & 157 & Fe  I & 4938.82 &  2.88 & $-$1.077 &  121 \\ 
Ca  I & 6166.44 &  2.52 & $-$1.140 & 103 & Fe  I & 4939.69 &  0.86 & $-$3.240 &  142 \\ 
Ca  I & 6169.04 &  2.52 & $-$0.800 & 126 & Fe  I & 5001.87 &  3.88 &	0.050 &  116 \\ 
Ca  I & 6169.56 &  2.52 & $-$0.480 & 143 & Fe  I & 5006.12 &  2.82 & $-$0.662 &  173 \\ 
Ca  I & 6455.60 &  2.52 & $-$1.290 &  95 & Fe  I & 5028.13 &  3.57 & $-$1.122 &   84 \\ 
Ca  I & 6471.67 &  2.52 & $-$0.875 & 122 & Fe  I & 5044.21 &  2.85 & $-$2.059 &  149 \\ 
Ca  I & 6499.65 &  2.52 & $-$0.820 & 115 & Fe  I & 5048.44 &  3.94 & $-$1.029 &  118 \\ 
Ca  I & 6717.69 &  2.71 & $-$0.610 & 136 & Fe  I & 5060.07 &  0.00 & $-$5.460 &  147 \\ 
Sc II & 5031.02 &  1.36 & $-$0.260 &  95 & Fe  I & 5068.77 &  2.94 & $-$1.041 &  159 \\ 
Sc II & 5239.81 &  1.46 & $-$0.770 &  85 & Fe  I & 5131.48 &  2.22 & $-$2.515 &  102 \\ 
Sc II & 5669.04 &  1.50 & $-$1.120 &  78 & Fe  I & 5145.10 &  2.20 & $-$2.876 &  106 \\ 
Sc II & 5684.19 &  1.51 & $-$1.050 &  77 & Fe  I & 5159.05 &  4.28 & $-$0.820 &   79 \\ 
Sc II & 6245.62 &  1.51 & $-$0.980 &  88 & Fe  I & 5162.28 &  4.18 &	0.020 &  157 \\ 
Sc II & 6604.60 &  1.36 & $-$1.480 &  36 & Fe  I & 5166.28 &  0.00 & $-$4.123 &  170 \\ 
Ti  I & 4997.10 &  0.00 & $-$1.722 & 132 & Fe  I & 5192.35 &  3.00 & $-$0.421 &  163 \\ 
Ti  I & 4999.51 &  0.83 &    0.140 & 180 & Fe  I & 5195.48 &  4.22 & $-$0.002 &  109 \\ 
Ti  I & 5001.01 &  2.00 & $-$0.052 &  78 & Fe  I & 5196.08 &  4.26 & $-$0.451 &   57 \\ 
Ti  I & 5009.65 &  0.02 & $-$1.900 & 105 & Fe  I & 5215.19 &  3.27 & $-$0.871 &  133 \\ 
Ti  I & 5039.96 &  0.02 & $-$1.170 & 134 & Fe  I & 5216.28 &  1.61 & $-$2.150 &  175 \\ 
Ti  I & 5064.65 &  0.05 & $-$0.985 & 152 & Fe  I & 5217.39 &  3.21 & $-$1.070 &  130 \\ 
Ti  I & 5147.48 &  0.00 & $-$1.876 & 149 & Fe  I & 5225.52 &  0.11 & $-$4.789 &  175 \\ 
Ti  I & 5152.19 &  0.02 & $-$1.912 & 134 & Fe  I & 5242.49 &  3.62 & $-$0.967 &  110 \\ 
\hline
Ti  I & 5173.75 &  0.00 & $-$1.120 & 178 & Fe  I & 5247.05 &  0.09 & $-$4.946 &  175 \\ 
Ti  I & 5219.70 &  0.02 & $-$1.980 & 137 & Fe  I & 5250.22 &  0.12 & $-$4.938 &  153 \\ 
Ti  I & 5866.46 &  1.07 & $-$0.840 & 133 & Fe  I & 5266.56 &  3.00 & $-$0.490 &  149 \\ 
Ti  I & 5922.12 &  1.05 & $-$1.470 &  91 & Fe  I & 5281.80 &  3.04 & $-$0.833 &  178 \\ 
Ti  I & 5965.83 &  1.88 & $-$0.410 & 120 & Fe  I & 5302.31 &  3.28 & $-$0.720 &  160 \\ 
Ti  I & 6064.63 &  1.05 & $-$1.970 &  65 & Fe  I & 5307.37 &  1.61 & $-$2.987 &  141 \\ 
Ti  I & 6126.22 &  1.07 & $-$1.420 &  90 & Fe  I & 5339.94 &  3.27 & $-$0.720 &  136 \\ 
Ti  I & 6258.10 &  1.44 & $-$0.355 & 105 & Fe  I & 5369.97 &  4.37 &	0.536 &  141 \\ 
Ti  I & 6556.08 &  1.46 & $-$0.943 &  57 & Fe  I & 5379.57 &  3.68 & $-$1.514 &   88 \\ 
Ti  I & 6743.13 &  0.90 & $-$1.630 &  90 & Fe  I & 5389.49 &  4.42 & $-$0.410 &  108 \\ 
Ti II & 5005.16 &  1.57 & $-$2.550 &  46 & Fe  I & 5393.18 &  3.24 & $-$0.715 &  147 \\ 
Ti II & 5013.68 &  1.58 & $-$1.935 & 119 & Fe  I & 5424.08 &  4.32 & 0.520 &  133 \\ 
Ti II & 5185.91 &  1.89 & $-$1.350 & 115 & Fe  I & 5569.63 &  3.42 & $-$0.500 &  138 \\ 
Ti II & 5226.55 &  1.57 & $-$1.300 & 173 & Fe  I & 5618.64 &  4.21 & $-$1.275 &   68 \\ 
Ti II & 5336.78 &  1.58 & $-$1.700 & 150 & Fe  I & 5753.12 &  4.26 & $-$0.688 &   83 \\ 
Ti II & 5396.23 &  1.58 & $-$2.925 &  36 & Fe  I & 5763.00 &  4.21 & $-$0.450 &   92 \\ 
Ti II & 5418.77 &  1.58 & $-$1.999 &  69 & Fe  I & 5862.36 &  4.55 & $-$0.058 &  108 \\ 
Ti II & 6606.95 &  2.06 & $-$2.790 &  50 & Fe  I & 5909.98 &  3.21 & $-$2.587 &  100 \\ 
 V  I & 6039.72 &  1.06 & $-$0.651 &  78 & Fe  I & 5916.25 &  2.45 & $-$2.834 &  124 \\ 
 V  I & 6081.44 &  1.05 & $-$0.578 &  52 & Fe  I & 5934.65 &  3.93 & $-$1.170 &   77 \\ 
 V  I & 6135.36 &  1.05 & $-$0.746 &  68 & Fe  I & 5956.71 &  0.86 & $-$4.605 &  146 \\ 
 V  I & 6243.10 &  0.30 & $-$0.978 & 128 & Fe  I & 5976.78 &  3.94 & $-$1.310 &   51 \\ 
 V  I & 6251.83 &  0.29 & $-$1.342 &  98 & Fe  I & 6024.06 &  4.55 & $-$0.120 &  106 \\ 
 V  I & 6274.66 &  0.27 & $-$1.670 &  66 & Fe  I & 6027.06 &  4.08 & $-$1.089 &   66 \\ 
Cr  I & 5247.57 &  0.96 & $-$1.640 & 146 & Fe  I & 6056.01 &  4.73 & $-$0.460 &   84 \\ 
Cr  I & 5296.70 &  0.98 & $-$1.400 & 146 & Fe  I & 6065.48 &  2.61 & $-$1.530 &  161 \\
Fe  I & 6078.49 &  4.79 & $-$0.424 &  81 & Fe II & 6432.68 &  2.89 & $-$3.708 &   23 \\ 
Fe  I & 6137.00 &  2.20 & $-$2.950 & 146 & Fe II & 6516.08 &  2.89 & $-$3.380 &   43 \\ 
Fe  I & 6173.34 &  2.22 & $-$2.880 & 155 & Co  I$^{\rm HFS}$ & 5301.01 &  1.71 & $-$2.000 &   72 \\ 
Fe  I & 6180.21 &  2.73 & $-$2.586 & 100 & Co  I$^{\rm HFS}$ & 5483.31 &  1.71 & $-$1.488 &  111 \\ 
Fe  I & 6213.44 &  2.22 & $-$2.481 & 142 & Co  I$^{\rm HFS}$ & 6814.89 &  1.96 & $-$1.900 &   86 \\ 
Fe  I & 6219.29 &  2.20 & $-$2.448 & 137 & Ni  I & 5035.36 &  3.63 &	0.290 &   96 \\
Fe  I & 6229.23 &  2.83 & $-$2.805 &  68 & Ni  I & 5080.53 &  3.65 &	0.134 &   75 \\ 
Fe  I & 6232.64 &  3.65 & $-$1.223 & 115 & Ni  I & 5084.09 &  3.68 &	0.034 &  111 \\
Fe  I & 6240.65 &  2.22 & $-$3.173 &  91 & Ni  I & 5146.48 &  3.71 & $-$0.060 &   70 \\ 
Fe  I & 6246.32 &  3.60 & $-$0.733 &  98 & Ni  I & 5578.71 &  1.68 & $-$2.641 &  130 \\ 
Fe  I & 6252.56 &  2.40 & $-$1.687 & 141 & Ni  I & 5587.85 &  1.94 & $-$2.142 &   96 \\ 
Fe  I & 6254.25 &  2.28 & $-$2.443 & 145 & Ni  I & 5592.26 &  1.95 & $-$2.588 &   80 \\ 
Fe  I & 6265.14 &  2.18 & $-$2.550 & 135 & Ni  I & 6128.97 &  1.68 & $-$3.390 &   73 \\ 
Fe  I & 6270.23 &  2.86 & $-$2.000 &  96 & Ni  I & 6176.82 &  4.09 & $-$0.430 &   52 \\ 
Fe  I & 6271.28 &  3.33 & $-$2.703 &  53 & Ni  I & 6177.25 &  1.83 & $-$3.600 &   48 \\ 
Fe  I & 6322.69 &  2.59 & $-$2.426 & 139 & Ni  I & 6327.59 &  1.68 & $-$3.090 &   97 \\ 
Fe  I & 6335.34 &  2.20 & $-$2.177 & 141 & Ni  I & 6378.26 &  4.15 & $-$0.820 &   40 \\ 
Fe  I & 6336.83 &  3.69 & $-$0.856 & 136 & Ni  I & 6482.81 &  1.94 & $-$2.630 &   84 \\ 
Fe  I & 6344.15 &  2.43 & $-$2.923 & 119 & Ni  I & 6586.32 &  1.95 & $-$2.812 &   91 \\ 
Fe  I & 6355.03 &  2.84 & $-$2.350 &  84 & Ni  I & 6767.78 &  1.83 & $-$2.170 &  121 \\ 
Fe  I & 6358.69 &  0.86 & $-$4.468 & 147 & Cu  I$^{\rm HFS}$ & 5105.51 &  1.39 & $-$1.505 &   90 \\ 
Fe  I & 6400.00 &  3.60 & $-$0.520 & 128 & Cu  I$^{\rm HFS}$ & 5782.06 &  1.64 & $-$1.720 &   79 \\ 
Fe  I & 6400.31 &  0.91 & $-$3.897 & 168 &  Y II & 4883.68 &  1.08 &	0.071 &  110 \\ 
Fe  I & 6475.63 &  2.56 & $-$2.941 & 103 &  Y II & 4900.11 &  1.03 & $-$0.090 &  115 \\ 
Fe  I & 6481.88 &  2.28 & $-$2.960 & 130 &  Y II & 5087.42 &  1.08 & $-$0.156 &   84 \\ 
Fe  I & 6498.95 &  0.96 & $-$4.687 & 144 &  Y II & 5200.41 &  0.99 & $-$0.570 &   98 \\ 
Fe  I & 6518.37 &  2.83 & $-$2.450 & 105 &  Y II & 5509.90 &  0.99 & $-$1.015 &   93 \\ 
Fe  I & 6574.22 &  0.99 & $-$5.004 & 115 & Zr II & 5112.28 &  1.66 & $-$0.590 &   42 \\ 
Fe  I & 6581.21 &  1.48 & $-$4.680 &  57 & Ba II & 4554.03 &  0.00 &	0.170 &  274 \\ 
Fe  I & 6609.12 &  2.56 & $-$2.692 & 128 & Ba II & 5853.00 &  0.60 & $-$1.010 &  130 \\ 
Fe  I & 6739.52 &  1.56 & $-$4.794 &  59 & Ba II & 6141.73 &  0.70 & $-$0.077 &  212 \\ 
Fe  I & 6750.15 &  2.42 & $-$2.608 & 140 & Ba II & 6496.91 &  0.60 & $-$0.380 &  201 \\ 
Fe II & 4923.93 &  2.89 & $-$1.307 & 166 & La II & 5114.56 &  0.23 & $-$1.060 &   55 \\ 
Fe II & 4993.35 &  2.81 & $-$3.485 &  37 & La II & 6390.46 &  0.32 & $-$1.400 &   45 \\ 
Fe II & 5197.58 &  3.23 & $-$2.233 &  88 & Ce II & 5274.23 &  1.04 &	0.150 &   33 \\ 
Fe II & 5234.63 &  3.22 & $-$2.220 &  94 & Nd II & 5249.59 &  0.98 &	0.217 &   54 \\ 
Fe II & 5425.26 &  3.20 & $-$3.372 &  22 & Dy II & 5169.69 &  0.10 & $-$1.660 &   12 \\ 
Fe II & 6247.56 &  3.89 & $-$2.329 &  24 &       &	   &	   &	\\ \hline
\end{tabular}   
\end{table}