\begin{table}%t3
\caption{\label{Fe_lines}Fe\small{I} \normalsize and \small II \normalsize lines used for the high-resolution fits.}
%\centering
\par
\begin{tabular}{c c }
\hline\hline\noalign{\smallskip}
Wavelength ($\AA$) & $\log gf$\\
\hline
Fe\small{I} \normalsize &  \\
\hline
6136.62&$-$1.410\\
6137.69&$-$1.403\\
6191.56&$-$1.416\\
6219.28&$-$2.448\\
6230.72&$-$1.281\\
6246.32&$-$0.877\\
6252.56&$-$1.767\\
6265.13&$-$2.540\\
6335.33&$-$2.177\\
6336.82&$-$0.856\\
6393.60&$-$1.576\\
6411.65&$-$0.717\\
6430.85&$-$1.946\\
6494.98&$-$1.239\\
6592.91&$-$1.473\\
6677.99&$-$1.418\\
\par
\hline
Fe\small{II} \normalsize & \\
\hline
\par
6084.11&$-$3.881\\
6149.26&$-$2.724\\
6238.39&$-$2.754\\
6247.56&$-$2.329\\
6416.92&$-$2.877\\
6432.68&$-$3.501\\
\hline
\end{tabular}
\tablefoot{The
  first column indicates
  the wavelength; the $\log gf$ value is taken from the VALD database
  and is given in the second column.}
\end{table}