\begin{table}%tB.3
\caption{\label{par_classII_low} Same as Table~\ref{par_classII_high} for \low\ sources.}
%\centering
\par
\begin{tabular}{cccccc}
\hline \hline
\noalign{\smallskip}
Source & \Vlsr \tablefootmark{a} & $\int F_\nu {\rm d}V$  &    $V$     &      $\Delta V$    &     $F_{\rm peak}$  \\
        & (km s$^{-1}$)  &  (Jy km s$^{-1}$)  & (km s$^{-1}$)  &  (km s$^{-1}$)  &  (Jy)  \\
\hline
05137+3919    & --25.4    &    $0.21\pm0.06$        & $-16.2\pm0.1$         &   $0.6\pm0.2$    &     0.3           \\ 
06099+1800* &   7.1\tablefootmark{f} &   $1.8\pm0.9$        &     $1.9\pm0.1$   &      $0.6\pm0.1$          &  2.8  \\
                         &                                 &    $5.1\pm0.9$        &     $4.0\pm0.1$    &     $0.3\pm0.1$          &  15.9 \\
                       &                                  &    $28.7\pm0.9$         &    $4.6\pm0.1$     &   $0.4\pm0.1$        &   63.6 \\
                      &                                   &  $15.6\pm0.9$         &    $5.4\pm0.1$   &     $0.4\pm0.1$         &  35.4  \\
17450-2742   & --16.9     &   $0.39\pm0.02$    & $-12.15\pm0.01$  &   $0.37\pm0.03$        &  0.986 \\        
18024-2119    &   0.5    &    $25\pm4$    &  $-5.33\pm0.03$        &  $0.42\pm0.08$    &  56.0          \\
    &       &    $67\pm3$            &  $-4.29\pm0.07$        &  $0.8\pm0.2$          &   78.9          \\
    &       &    $28\pm2$    &  $-3.81\pm0.02$        &  $0.32\pm0.05$  &     83.9 \\         
    &       &    $39\pm2$           &   $-3.22\pm0.03$        &  $0.50\pm0.07$  &    73.4        \\  
    &       &    $27\pm2$    &  $-5.3\pm0.1$        &  $0.5\pm0.1$         &    55.4         \\
    &        &   $48\pm2$    &  $-4.4\pm0.1$        &  $0.6\pm0.1$         &    74.2        \\
    &        &   $51\pm2$    &  $-3.8\pm0.1$        &  $0.5\pm0.1$         &    105.        \\
    &        &   $33\pm2$    &  $-3.2\pm0.1$        &  $0.4\pm0.1$         &    76.5        \\
    &       &    $5\pm2$   &   $-2.6\pm0.1$        &  $0.6\pm0.1$         &    8.65        \\
    &       &    $6.2\pm0.3$    &     $-0.827\pm0.004$        &  $0.86\pm0.06$  &    6.75  \\         
    &        &    $10.7\pm0.2$       &    $-9.90.09\pm0.006$         &  $0.62\pm0.01$  &    16.1        \\
    &       &   $54.3\pm0.3$         &      $1.891\pm0.004$         &  $1.066\pm0.009$   &   47.9        \\
    &       &    $24.4\pm0.1$ &        $2.69\pm0.01$         &   $1.29\pm0.03$  &    17.7         \\
18144-1723    &  47.3    &    1.40  $\pm$  0.04  &    47.510 $\pm$ 0.005  &         0.43 $\pm$ 0.01  &    3.04 \\        
    &       &    8.95 $\pm$ 0.04   &   49.020 $\pm$ 0.003  &         0.464 $\pm$ 0.003  &    18.1  \\        
    &       &   6.35 $\pm$ 0.04   &   49.600 $\pm$ 0.003  &         0.355 $\pm$ 0.003  &    16.8 \\         
    &       &   2.18 $\pm$ 0.03   &   50.330 $\pm$ 0.004  &         0.464 $\pm$ 0.007  &    4.42  \\        
    &       &   12.51 $\pm$ 0.03   &   51.090 $\pm$ 0.003  &         0.479 $\pm$ 0.003  &    24.5  \\        
    &      &    1.50 $\pm$ 0.02   &   51.900 $\pm$ 0.003  &         0.344 $\pm$ 0.006    &   4.10  \\        
18181-1534     &  --5.8\tablefootmark{b}     &   1.61 $\pm$ 0.03   & --3.740 $\pm$ 0.002  &         0.296 $\pm$ 0.006    &   5.1  \\        
     &       &   20.06 $\pm$ 0.03   & --2.999 $\pm$ 0.003  &         0.399 $\pm$ 0.003   &   47.2  \\         
18224-1228     &  48.8\tablefootmark{b}     &   2.14 $\pm$ 0.02 &         38.700 $\pm$ 0.002         & 0.394 $\pm$ 0.005   &   5.1         \\
    &       &   0.08 $\pm$ 0.01 &          39.60 $\pm$ 0.02         &  0.19 $\pm$ 0.04  &   0.401         \\
18278-1009    &  93.7   &     0.07 $\pm$ 0.02 &          108.70 $\pm$ 0.02 &     0.19 $\pm$ 0.09  &   0.35  \\          
    &       &    0.45 $\pm$ 0.02  &          109.800 $\pm$ 0.007   &  0.35 $\pm$ 0.02   &   1.19           \\
    &       &   0.46 $\pm$ 0.02  &          110.900 $\pm$ 0.005    & 0.30 $\pm$ 0.01   &   1.46          \\
    &       &   1.7 $\pm$ 0.2  &         115.9 $\pm$ 0.1        &    1.1 $\pm$ 0.1        &       1.48                    \\
    &       &    2.5 $\pm$ 0.2  &         116.5 $\pm$ 0.1        &   0.5 $\pm$ 0.1          &     4.46                    \\
    &      &    5.4 $\pm$ 0.2  &         117.2 $\pm$ 0.1        &   0.5 $\pm$ 0.1  &               9.98          \\         
    &      &    1.1 $\pm$ 0.2  &         117.9 $\pm$ 0.1        &   0.4 $\pm$ 0.1           &    2.50                  \\
    &  93.7   &    0.4 $\pm$ 0.2 &         118.4 $\pm$ 0.1        &   0.3 $\pm$ 0.1        &       1.13          \\         
    &      &    1.24 $\pm$ 0.02   &         119.000 $\pm$ 0.003  &    0.405 $\pm$ 0.009  &    2.88  \\          
    &       &   0.86 $\pm$ 0.04   &          119.600 $\pm$ 0.007  &   0.39 $\pm$ 0.02   &   2.08          \\ 
    &      &    0.22 $\pm$ 0.04   &          120.20 $\pm$ 0.05  &   0.5 $\pm$ 0.1        &      0.381 \\          
18441-0134     &  57.6\tablefootmark{b}   &    0.22 $\pm$ 0.07  &          78.0 $\pm$ 0.1          &  0.2 $\pm$ 0.1          &    1.02                  \\
    &       &    2.05 $\pm$ 0.07  &         79.2 $\pm$ 0.1     &    0.8 $\pm$ 0.1         &     2.54                  \\
    &      &     3.53 $\pm$ 0.07  &         80.9 $\pm$ 0.1         &  1.1 $\pm$ 0.1          &    3.04          \\
    &       &    0.36 $\pm$ 0.02  &          83.080 $\pm$ 0.005         &  0.26 $\pm$ 0.01   &   1.31  \\        
    &         &   0.35 $\pm$ 0.02  &          83.870 $\pm$ 0.009         &  0.35 $\pm$ 0.02   &   0.946        \\ 
18511+0146    &   56.8   &      0.12 $\pm$ 0.02  &  59.74 $\pm$ 0.03    &    0.42 $\pm$ 0.08   &  0.27626   \\
18527+0301    &  76.0    &    3.6 $\pm$ 0.3  &        70.3 $\pm$ 0.1        &  0.6 $\pm$ 0.1          &    5.78          \\
    &      &    2.0 $\pm$ 0.3  &         71.9 $\pm$ 0.1        &  0.6 $\pm$ 0.1          &    3.00           \\
    &      &    10.1 $\pm$ 0.3  &         72.8 $\pm$ 0.1        &  0.7 $\pm$ 0.1          &    14.4            \\
    &      &    9.1 $\pm$ 0.3  &         74.3 $\pm$ 0.1        &  0.5 $\pm$ 0.1          &    18.2         \\
    &       &   0.8 $\pm$ 0.3  &        76.1 $\pm$ 0.1        &  0.4 $\pm$ 0.1  &    2.02           \\
    &      &    1.06 $\pm$ 0.08 &         81.4 $\pm$ 0.1          &  0.6 $\pm$ 0.1           &    1.55         \\
    &       &   1.32 $\pm$ 0.08 &         82.1 $\pm$ 0.1          &  0.4 $\pm$ 0.1           &   3.29         \\
    &      &    2.64 $\pm$ 0.08 &         83.9 $\pm$ 0.1          &  0.7 $\pm$ 0.1           &   3.78        \\
19012+0505    &   40.4    &    0.32 $\pm$ 0.04 &     31.95 $\pm$ 0.06  &    1.2 $\pm$ 0.2        &   0.243  \\    
19092+0841   &   58.0     &   3.7 $\pm$ 0.09 &         54.8 $\pm$ 0.1         &  0.6 $\pm$ 0.1           &   6.31         \\
    &       &    0.56 $\pm$ 0.09 &          55.5 $\pm$ 0.1         &  0.4 $\pm$ 0.1           &   1.49         \\
    &       &    0.61 $\pm$ 0.09  &          56.2 $\pm$ 0.1          &  0.4 $\pm$ 0.1           &   1.34         \\
    &        &   0.84 $\pm$ 0.09 &          56.8 $\pm$ 0.1         &  0.6 $\pm$ 0.1           &   1.24          \\
    &        &   0.16 $\pm$ 0.09 &          58.1 $\pm$ 0.1         &  0.3 $\pm$ 0.1          &   0.539          \\
    &      &    1.67 $\pm$ 0.04 &         62.440 $\pm$ 0.009        &  0.96 $\pm$ 0.03 &     1.63 \\  \hline
19120+1148   &  55.0     &   0.16 $\pm$ 0.02 &     57.96 $\pm$ 0.04   &          0.6 $\pm$ 0.1  &   0.251 \\        
   &       &   0.21 $\pm$ 0.02 &     59.00 $\pm$ 0.01    &      0.39 $\pm$ 0.05   &  0.519          \\
   &       &    0.15 $\pm$ 0.03  &    62.11 $\pm$ 0.09        &   1.0 $\pm$ 0.2          &   0.141         \\
19186+1440   &     --    &    0.47 $\pm$ 0.02 & --26.670 $\pm$ 0.007  &         0.33 $\pm$ 0.02  &    1.33 \\        
   &         &   1.37 $\pm$ 0.03   & --25.800 $\pm$ 0.008  &         0.79 $\pm$ 0.02   &   1.62 \\        
   &         &   0.18 $\pm$ 0.05  & --23.99 $\pm$ 0.08  &         0.9 $\pm$ 0.5         &   0.185          \\
   &         &   0.92 $\pm$ 0.07  & --14.86 $\pm$ 0.03  &         0.78 $\pm$ 0.06  &     1.11 \\            
    &        &   0.75 $\pm$ 0.06 & --14.370 $\pm$ 0.006   &         0.37 $\pm$ 0.01   &   1.90 \\        
    &        &   2.52 $\pm$ 0.03   & --13.380 $\pm$ 0.003  &         0.677 $\pm$ 0.008   &   3.50  \\            
    &        &   3.15 $\pm$ 0.03   & --12.110 $\pm$ 0.003  &         0.698 $\pm$ 0.006    &   4.24  \\             
    &        &   2.97 $\pm$ 0.03   & --10.750 $\pm$ 0.004  &         1.00 $\pm$ 0.01   &   2.80  \\           
22187+5559    &   --45.2\tablefootmark{e}     &   0.09 $\pm$ 0.03        & --11.44 $\pm$ 0.08   &  0.6 $\pm$ 0.3  &         0.133        \\
\hline
\end{tabular}    
\end{table}