\begin{table}%t2
\caption{\label{table2}\spitzer\ and  \scuba~ flux densities.}
%%\centering

\par
\begin{tabular}{l  r   r   r   r   r   r  r  r  r}  
\hline\hline
 \noalign{\smallskip}
Source name & 3.6~$\mu$m    &   4.5~$\mu$m  & 5.8~$\mu$m &  8.0~$\mu$m
           &  24~$\mu$m &  70~$\mu$m &  160~$\mu$m   &  450~$\mu$m   &  850~$\mu$m     \\
           & [$\mu$Jy]  & [$\mu$Jy]    & [$\mu$Jy] &  [$\mu$Jy] &  [$\mu$Jy] & [mJy] &  [mJy]  & [mJy]   &  [mJy]  \\
           \hline
\par
PKS~0537\#43         &   423 $\pm$   42&  918  $\pm$  92&  1750 $\pm$ 175 &     3202  $\pm$ 320	&  6879	$\pm$ 688& 27.0 $\pm$ 4.5 &  39.6 $\pm$  7.8 &      &  \\
PKS~0537\#11a         &   57  $\pm$   6 &   69  $\pm$  7 &    95 $\pm$ 10 &      168  $\pm$  17	&   517	$\pm$ 57 &   $<$3.6 &  $<$24  &      &   \\
 PKS~0537\#164        &   21  $\pm$  2  &   18  $\pm$  2 &    19 $\pm$ 4 &      23  $\pm$   5	&   $<$60   &   $<$3.6 &  $<$24  &      &   \\
 PKS~0537\#123        &   84  $\pm$   9 &   96  $\pm$ 10 &   113 $\pm$ 13 &      165  $\pm$  17	&   747	$\pm$ 81 &   $<$ 3.6 &  $<$24  &      &   \\
 GD~158\#62           &   60  $\pm$   6 &   91  $\pm$  9 &   155 $\pm$ 17 &      339  $\pm$  35	&  1608	$\pm$ 164&   $<$ 3.6 &  $<$24  &   $<$74   & $<$6.1 \\ 
 GD~158\#19           &  226  $\pm$  23 &  387  $\pm$ 39 &   756 $\pm$
 76 &      1547 $\pm$ 155	&  5326	$\pm $ 534& 27.0 $\pm$ 4.5&37.7 $\pm$  7.8&$<$94.3 & 8.6 $\pm$ 2.1\\
\par
 Mrk~509\#01          &   63  $\pm$   7 &   51  $\pm$  6 &    60 $\pm$
 11 &      59  $\pm$  10	&  $<$60	 &    $<$3.6  & $<$24
 &     $<$82   &  $<$6.6  \\  
 Mrk~509\#13          &   51  $\pm$  6  &   69  $\pm$  7 &   110 $\pm$ 11 &      215  $\pm$  17	&   866	$\pm$ 94&    $<$3.6  & $<$24 &     $<$75  &   $<$6.2	    \\
 Abell~2690\#75       &   51  $\pm$  5  &   56  $\pm$  6 &    89 $\pm$ 11 &      139  $\pm$  15	&   565	$\pm$ 62&    &         &     & 	    \\
 PKS~0312\#36    &   41  $\pm$  4  &   44  $\pm$  5 &    40 $\pm$  8 &      710  $\pm$  9	&   236	$\pm$ 30&    &       &     & 	    \\
 PKS~0537\#91    &   28  $\pm$  4  &   35  $\pm$  4 &    42 $\pm$  8 &      800  $\pm$  10	&   301	$\pm$ 40&     &       &    & 	   \\
 PKS~0537\#54    &   31  $\pm$  4  &   35  $\pm$  4 &    50 $\pm$ 10 &      470  $\pm$  8	&  279	$\pm$ 45&       &       &   &	    \\
 PKS~0537\#111   &   88  $\pm$  9  &   75  $\pm$ 8	 &    41 $\pm$  6 &      460  $\pm$  7	&  148	$\pm$ 28&        &      &     & 	    \\
 Abell~2690\#29       &   141 $\pm$  14 &  185  $\pm$ 19 &   260 $\pm$ 27 &      371  $\pm$  38	& 1012	$\pm$ 106&      &      &     & 	    \\
 PKS~0312\#45    &   50  $\pm$   6 &   62  $\pm$  7 &    69 $\pm$ 10 &      780  $\pm$  10	&  249	$\pm$  35&      &       &     & 	    \\
 BPM~16274\#69        &   86  $\pm$   9 &   92  $\pm$  9 &    97 $\pm$ 11 &      120  $\pm$  13	&  286	$\pm$  34&      &       &    & 	   \\
\hline 
\end{tabular}
\tablefoot{The upper limits are given at the 3$\sigma$ confidence level.}  
\end{table}