\begin{table}%T1
\caption{\label{tab:List-of-frequencies}List of frequencies detected above
$4\times$ the local noise ($f_{n}$) and above $3.6\times$ the noise
($u_{n}$). $n$ is by order of decreasing amplitude.}\vspace{-1mm}
\small%\centering
\par
\begin{tabular}{lccccccccc} 
\hline \hline \noalign{\smallskip}
Id. & Frequency & $\sigma_f$ & Period & $\sigma_P$ & Amplitude & $\sigma_A$ & Phase & $\sigma_{\rm Ph}$ & $S/N$\\
    & ($\mu$Hz) & ($\mu$Hz) & (s) & (s) & ($\%$) & ($\%$) & (s) & (s) &\\
\hline  
$f_{17}$ & 95.0881 & 0.0654 & 10516.563 & 7.230 & 0.0243 & 0.0058 & 9196.211 & 512.076 & 4.2\\
$f_{12}$ & 113.5974 & 0.0461 & 8803.020 & 3.570 & 0.0342 & 0.0057 & 3097.336 & 306.998 & 5.9\\ 
$f_{16}$ & 117.9662 & 0.0650 & 8477.007 & 4.670 & 0.0243 & 0.0058 & 125.577 & 460.611 & 4.2\\ 
$f_{14}$ & 120.4154 & 0.0566 & 8304.588 & 3.904 & 0.0279 & 0.0058 & 5563.030 & 356.917 & 4.8\\ 
$f_{11}$ & 130.8794 & 0.0429 & 7640.621 & 2.505 & 0.0373 & 0.0058 & 3842.884 & 243.473 & 6.4\\ 
$f_{13}$ & 136.9661 & 0.0529 & 7301.076 & 2.818 & 0.0307 & 0.0059 & 6457.970 & 281.566 & 5.2\\ 
$f_{15}$ & 146.6156 & 0.0609 & 6820.557 & 2.835 & 0.0267 & 0.0059 & 1516.847 & 304.287 & 4.5\\ 
$f_{10}$ & 204.9958 & 0.0380 & 4878.150 & 0.904 & 0.0410 & 0.0057 & 2932.295 & 262.895 & 7.2\\ 
$f_{1}$ & 205.2887 & 0.0063 & 4871.190 & 0.150 & 0.2456 & 0.0057 & 3608.717 & 43.963 & 43.2\\ 
$f_{4}$ & 216.5288 & 0.0142 & 4618.324 & 0.303 & 0.1078 & 0.0056 & 2251.975 & 51.055 & 19.3\\ 
$f_{8}$ & 229.3277 & 0.0299 & 4360.573 & 0.569 & 0.0520 & 0.0057 & 1644.060 & 99.662 & 9.2\\ 
$f_{6}$ & 273.0739 & 0.0169 & 3662.012 & 0.227 & 0.0914 & 0.0056 & 2865.705 & 47.828 & 16.2\\ 
$f_{2}$ & 276.6529 & 0.0105 & 3614.638 & 0.137 & 0.1455 & 0.0056 & 1612.710 & 29.661 & 26.0\\ 
$f_{9}$ & 284.5848 & 0.0305 & 3513.892 & 0.377 & 0.0507 & 0.0056 & 3425.154 & 92.582 & 9.0\\ 
$f_{5}$ & 298.0091 & 0.0155 & 3355.602 & 0.174 & 0.1009 & 0.0057 & 2457.427 & 39.601 & 17.7\\ 
$f_{3}$ & 352.2916 & 0.0136 & 2838.557 & 0.110 & 0.1135 & 0.0056 & 2664.213 & 29.659 & 20.2\\ 
$f_{7}$ & 384.3322 & 0.0244 & 2601.915 & 0.165 & 0.0631 & 0.0056 & 1803.574 & 48.919 & 11.2\\  
& \\[-1mm] 
$u_{1}$ & 117.2195 & 0.0691 & 8531.006 & 5.027 & 0.0229 & 0.0058 & 7517.549 & 490.815 & 4.0\\ 
$u_{4}$ & 152.3785 & 0.0756 & 6562.604 & 3.258 & 0.0213 & 0.0059 & 3819.971 & 367.249 & 3.6\\ 
$u_{2}$ & 221.3004 & 0.0682 & 4518.744 & 1.392 & 0.0225 & 0.0056 & 1714.822 & 238.775 & 4.0\\ 
$u_{5}$ & 284.0690 & 0.0728 & 3520.271 & 0.903 & 0.0213 & 0.0056 & 866.705 & 113.756 & 3.8\\ 
$u_{6}$ & 302.2223 & 0.0733 & 3308.822 & 0.802 & 0.0211 & 0.0056 & 2066.142 & 186.802 & 3.7\\ 
$u_{7}$ & 323.3522 & 0.0693 & 3092.603 & 0.663 & 0.0217 & 0.0055 & 2569.895 & 168.049 & 4.0\\ 
$u_{3}$ & 396.1909 & 0.0768 & 2524.036 & 0.490 & 0.0201 & 0.0056 & 717.987 & 149.346 & 3.6\\  
\hline 
\end{tabular} \vspace{-2mm}
\end{table}