\begin{table}%t2
%\centering
\par
\caption{\label{phot}Component photometry (absolute magnitudes).} 
\par
\small\begin{tabular}{lcccc}
\hline\hline
Component& m$_{\rm H}$ &m$_{\rm i'}$ &SpT&mass    \\
     & [mag] & [mag]     \\ \hline
A    & $3.5 \pm 0.2$ & $4.6 \pm 0.3$& G8IV to K0IV& 1.01~$M_\odot$\\
B    & $7.3 \pm 0.2$ & $10.1 \pm 0.4$&M4V& $\rm 0.21^{+0.03}_{-0.02 }$~$M_\odot$ \\
\hline
\end{tabular}
\vspace*{8mm}
 \end{table}