\begin{table}
 %     \caption{\small{VLT/ISAAC journal of observations. We report in the fourth column the net accumulated exposure time. Column five gives the obtained signal-to-noise ratio. The reference in the last column relates to the identification of the optical/infrared counterpart. }}
 %        \label{table:logobs1}
  %      %\begin{center}
\par
  %       \resizebox{\textwidth}{!}{
 %           \begin{tabular}{lccccccl}
  %           \hline
  %           \hline
 %            \noalign{\smallskip}
 %             Source  & K &  Start time &  Exp. & S/N & R                                                 &    IR                &           Reference\\
 %                           &      mag         &      (UT)      &   (s)    &        &  ($\lambda/\Delta\lambda$)  & counterpart   &          \\                       
 %            \noalign{\smallskip}
  %            \hline
  %           \noalign{\smallskip}
  %                    IGR~J16493--4348 & 11.9 & 2007-04-05  09:38 &  360  &  150  & 500 &  2MASS J16492695-4349090 & Kuiper et al. (2005)\\
  %          \noalign{\smallskip}
  %          \hline
  %       \end{tabular}}
%         %\end{center}
\par
 % \end{table}