\begin{table}%t1
%\centering
\par
\caption{\label{tab1}Fundamental parameters.}
\tiny
\renewcommand{\tabcolsep}{0.73mm}
\par
\begin{tabular}{cccccccccccccccc}
\hline\hline
&\multicolumn{6}{c}{WEBDA}&&\multicolumn{8}{c}{This work}\\
\cline{2-7}\cline{9-16}
Cluster&$\alpha(2000)$&$\delta(2000)$&Age&\ebv&\ds&$D$&&$\alpha(2000)$&$\delta(2000)$&
        $\ell$&$b$&Age&\ebv&\ds&\dSC\\
 & (hms)&($\degr~\arcmin~\arcsec$)&(Myr)&(mag)&(kpc)&(\arcmin)&&(hms)&($\degr~\arcmin~\arcsec$)
 &(\degr)&(\degr)&(Myr)&(mag)&(kpc)&(kpc)\\
(1)&(2)&(3)&(4)&(5)&(6)&(7)&&(8)&(9)&(10)&(11)&(12)&(13)&(14)&(15)\\
\hline
Cr~197&08:44:51&$-$41:14:00&13&0.55&0.84&17.0&&08:44:40.3&$-$41:16:48.4&261.51&$+$0.94
         &$5\pm4$&$0.34\pm0.16$&$1.05\pm0.20$&$0.23\pm0.04$\\
vdB~92&07:03:54&$-$11:29:23&40&0.25&1.50&24.0&&07:03:56.4&$-$11:34:54.7&224.66&$-$2.52
       &$5\pm4$&$0.22\pm0.13$&$1.38\pm0.26$&$1.04\pm0.19$ \\
\hline
\end{tabular}
\tablefoot{Column~7: optical diameter; Col.~14: distance from the Sun; Col.~15: distance from 
the Solar circle. WEBDA data for Cr~197 is based on photometry from \citet{VM73}.}
\end{table}