\begin{table}%t1
\caption{\label{tab:default}Reference values for the inputs.}
%\centering
\par
\begin{tabular}{ll} \hline\hline
Input name              &               Default value/dependence/set                  \vspace{0.05cm}\\\hline
& \multicolumn{1}{c}{} \vspace{-0.25cm} \\ 
Gas                     &  $\Sigma=6.17 \times 10^{20}$~cm$^2, \quad f_{\rm H}= 90\%$    \vspace{0.05cm}\\
Source spectrum         &  $\eta_{\rm S}=-1, \quad \alpha+\delta=2.65$                      \vspace{0.05cm}\\
$K(E)$ and $K_{\rm pp}(E)$  &  Slab Alfv\'en (SA): Eqs.~(\ref{eq:K(E)}) \& (\ref{eq:Va})  \vspace{0.05cm}\\
Cross-sections          &  W03 \citep{2003ApJS..144..153W}                            \vspace{0.05cm}\\
Data                    &  B/C, dataset F\tablefootmark{\dagger}                                   \vspace{0.05cm}\\
\hline
\end{tabular}
\tablefoot{In subsequent tables of the paper, all results obtained with the default inputs are in {\em italics}. \tablefoottext{\dagger}{31 data points from IMP7-8, Voyager~1\&2, ACE, HEA0-3, Spacelab, and CREAM04.}}
%
\end{table}