\begin{table}%t3
%\centering
\par
\caption{\label{t:magqual}Magnitude qualifiers used by Hevelius.}
\par
\begin{tabular}{lcclcc}
\hline\hline\noalign{\smallskip}
.$n$+1 or .$n$+1. & + & 22 &   3.0.6  & V & H~593\\
.$n$$-$1 or .$n$$-$1. & -- & 8 & $n$ imo major & M &  H~965\\
fere & f & 9 & non nisi tub.\ vis. & T & H~956 \\
imo $n$+1 & I &  H~88 & non nisi tubo visibilis & T & H~1250 \\
imo $n$$-$1  & i & H~530\\
\hline
\end{tabular}
\tablefoot{For each qualifier for magnitude~$n$ we give our indication in the machine-readable \hevelius\ and the number of occurrences.  If it occurs only once, the H number is given.}
\end{table}