\begin{table}%f2
%%\begin{center}
\par

\begin{table}{rcccrlcrrrrcl}   %{ccl|cc|cc|cc|r}
\caption{\label{linelist} Line data and abundances from an analysis of {\LyudmilasStar}. $\Gamma_6$ corresponds to 10~000~K. Column 6 gives references to the adopted $gf-$values. Column 13 gives references to the sources of the used IS and HFS data and adopted $\Gamma_6-$values.}  
\begin{tabular}{rcccrlcrrrrcl}
\hline \hline\noalign{\smallskip}
 $Z$ & Atom/ & $\lambda$ & $E_{\rm exc}$ & $\log gf$ & \multicolumn{1}{c}{\rm Ref} & \multicolumn{3}{c}{$\eps{}$} & [X/Fe] & $W_\lambda$ &  $\log \Gamma_6/N_{\rm H}$ & Note, Ref. \\
\cline{7-9}
   &  mol  & (\AA)     & (eV)     &   &   & Solar & LTE  & NLTE & & (m\AA) & (rad/s$\cdot$cm$^3$)& \\
%\hline 
 1 & 2 & 3 & 4 & \multicolumn{1}{c}{5} & \multicolumn{1}{c}{6} & 7 & \multicolumn{1}{c}{8} & \multicolumn{1}{c}{9} & \multicolumn{1}{c}{10} & \multicolumn{1}{c}{11} & 12 & \multicolumn{1}{c}{13} \\
\hline
  3 & Li 1 & 6707.80 & 0.00 &  0.167 & NIST8 &  1.10 &  0.99 & &  2.67 & Syn &  $-$7.574 & IS:SRE95 \\
    &      &         &      &        &       &      &       &      &      &      &        & $\Gamma_6$:ABO \\
\multicolumn{13}{c}{ } \\
  6 & CH   &  \multicolumn{3}{l}{4310.0--4312.5} & BCB05 & 8.39 & 5.74 & & 0.13 & Syn & \\
  6 & CH   &  \multicolumn{3}{l}{4313.4--4313.8} & BCB05 & 8.39 & 5.74 & & 0.13 & Syn & \\
  6 & CH   &  \multicolumn{3}{l}{4362.4--4364.6} & BCB05 & 8.39 & 5.76 & & 0.15 & Syn & \\
  6 & CH   &  \multicolumn{3}{l}{4366.0--4367.0} & BCB05 & 8.39 & 5.73 & & 0.12 & Syn & \\
\multicolumn{13}{c}{ } \\
  7 & NH   &  \multicolumn{3}{l}{3358--3361} & K94  & 7.86 & 4.78 & & $-$0.30 & Syn & \\
\multicolumn{13}{c}{ } \\
 11 & Na 1 & 5889.96 & 0.00 &  0.110 & NIST8 &  6.30 &  3.28 & 2.89 & $-$0.63 & Syn &  $-$7.712 & $\Gamma_6$:GLS04\\
 11 & Na 1 & 5895.93 & 0.00 & $-$0.190 & NIST8 &  6.30 &  3.24 & 2.96 & $-$0.56 & Syn &  $-$7.712 & the same \\
\multicolumn{13}{c}{ } \\
 12 & Mg 1 & 4571.10 & 0.00 & $-$5.620 & NIST8 &  7.54 &  4.86 & 4.98 &  0.22 & Syn &  $-$7.856 & $\Gamma_6$:GLS04\\
 12 & Mg 1 & 4702.99 & 4.33 & $-$0.440 & NIST8 &  7.54 &  4.79 & 4.90 &  0.14 & Syn &  $-$6.956 & the same \\
 12 & Mg 1 & 5528.41 & 4.33 & $-$0.498 & NIST8 &  7.54 &  4.84 & 4.96 &  0.20 & Syn &  $-$7.152 & the same \\
\multicolumn{13}{c}{ } \\
 13 & Al 1 & 3961.52 & 0.01 & $-$0.340 & NIST8 &  6.47 &  2.50 & 3.02 & $-$0.67 & Syn &  $-$7.552 & $\Gamma_6$:GLS04\\
\multicolumn{13}{c}{ } \\
 14 & Si 1 & 3905.53 & 1.91 & $-$1.041 & BL91  &  7.52 &  4.85 &      &  0.11 & Syn &  $-$7.440 & $\Gamma_6$:ABO\\
\multicolumn{13}{c}{ } \\
 20 & Ca 1 & 4425.44 & 1.88 & $-$0.358 & SON75 & 6.33 &  3.52 & 3.76 & 0.20 & 23.7 & $-$7.432 & $\Gamma_6$:MKP07 \\
 20 & Ca 1 & 5349.46 & 2.71 & $-$0.310 & SR81  & 6.33 &  3.52 & 3.78 & 0.21 &  4.6 & $-$7.652 & $\Gamma_6$:S81 \\
 20 & Ca 1 & 5588.75 & 2.53 &  0.358 & SR81  & 6.33 &  3.57 & 3.86 & 0.26 & 22.8 & $-$7.628 & $\Gamma_6$:S81 \\
 20 & Ca 1 & 5857.45 & 2.93 &  0.240 & SR81  & 6.33 &  3.67 & 3.86 & 0.36 & 11.2 & $-$7.316 & $\Gamma_6$:S81 \\
 20 & Ca 1 & 6122.22 & 1.89 & $-$0.315 & SON75 & 6.33 &  3.68 & 3.90 & 0.36 & 29.5 & $-$7.189 & $\Gamma_6$:ABO \\
 20 & Ca 1 & 6162.17 & 1.90 & $-$0.089 & SON75 & 6.33 &  3.63 & 3.84 & 0.32 & 38.6 & $-$7.189 & $\Gamma_6$:ABO \\
 20 & Ca 1 & 6169.56 & 2.53 & $-$0.478 & SR81  & 6.33 &  3.52 & 3.81 & 0.21 &  4.7 & $-$7.264 & $\Gamma_6$:S81 \\
 20 & Ca 1 & 6439.08 & 2.53 &  0.390 & SR81  & 6.33 &  3.63 & 3.80 & 0.31 & 27.4 & $-$7.704 & $\Gamma_6$:S81 \\
 20 & Ca 2 & 8498.02 & 1.69 & $-$1.416 & Th89  & 6.33 &  $-$    & 3.82 & 0.27 & Syn~ & $-$7.676 & IS:NBI98 \\
    &      &         &      &        &       &      &       &      &      &      &        & $\Gamma_6$:ABO \\
\multicolumn{13}{c}{ } \\
 21 & Sc 2 & 4246.82 & 0.32 &  0.240 & LD89 &  3.10 &  0.08 & & $-$0.24 & Syn &         & HFS:MPS95 \\
 21 & Sc 2 & 4400.39 & 0.60 & $-$0.540 & LD89 &  3.10 &  0.08 & & $-$0.24 & Syn &         & the same  \\
 21 & Sc 2 & 4415.56 & 0.60 & $-$0.670 & LD89 &  3.10 &  0.13 & & $-$0.19 & Syn &         & the same \\
 21 & Sc 2 & 5031.02 & 1.36 & $-$0.400 & LD89 &  3.10 &  0.09 & & $-$0.23 & Syn &         & the same \\
\multicolumn{13}{c}{ } \\
 22 & Ti 1 & 3998.64 & 0.05 & $-$0.056 & WF75 & 4.90 &  2.14 &  &   0.02 &  37.3 & $-$7.654 & $\Gamma_6$:ABO \\
 22 & Ti 1 & 4533.25 & 0.85 &  0.476 & WF75 & 4.90 &  2.06 &  &  $-$0.06 &  19.7 & $-$7.593 & the same      \\
 22 & Ti 1 & 4534.78 & 0.84 &  0.280 & WF75 & 4.90 &  2.01 &  &  $-$0.11 &  12.5 & $-$7.596 & the same      \\
 22 & Ti 1 & 4981.73 & 0.85 &  0.504 & WF75 & 4.90 &  2.15 &  &   0.03 &  25.6 & $-$7.626 & the same      \\
 22 & Ti 1 & 4991.06 & 0.84 &  0.380 & WF75 & 4.90 &  2.15 &  &   0.03 &  21.0 & $-$7.629 & the same      \\
 22 & Ti 1 & 5022.87 & 0.83 & $-$0.434 & WF75 & 4.90 &  2.14 &  &   0.02 &   3.9 & $-$7.633 & the same      \\
 22 & Ti 1 & 5024.85 & 0.82 & $-$0.602 & WF75 & 4.90 &  2.32 &  &   0.20 &   4.1 & $-$7.635 & the same      \\
 22 & Ti 1 & 5039.96 & 0.02 & $-$1.130 & WF75 & 4.90 &  2.09 &  &  $-$0.03 &   5.7 & $-$7.720 & the same      \\
 22 & Ti 1 & 5064.66 & 0.05 & $-$0.991 & WF75 & 4.90 &  2.18 &  &   0.06 &   8.8 & $-$7.719 & the same      \\
 22 & Ti 1 & 5210.39 & 0.05 & $-$0.884 & WF75 & 4.90 &  2.21 &  &   0.09 &  11.8 & $-$7.724 & the same      \\
 22 & Ti 2 & 3913.47 & 1.12 & $-$0.420 & PTP01 & 4.90 &  2.29 &  &   0.17 &  87.4 &  &	  \\
 22 & Ti 2 & 4028.34 & 1.89 & $-$0.960 & PTP01 & 4.90 &  2.25 &  &   0.13 &  21.8 &  &	  \\
 22 & Ti 2 & 4053.83 & 1.89 & $-$1.130 & PTP01 & 4.90 &  2.11 &  &  $-$0.01 &  11.9 &  &	  \\
 22 & Ti 2 & 4290.22 & 1.16 & $-$0.850 & PTP01 & 4.90 &  2.16 &  &   0.04 &  66.5 &  &	  \\
 22 & Ti 2 & 4300.05 & 1.18 & $-$0.440 & PTP01 & 4.90 &  2.41 &  &   0.29 &  93.3 &  &	  \\
 22 & Ti 2 & 4394.05 & 1.22 & $-$1.780 & PTP01 & 4.90 &  2.24 &  &   0.12 &  20.5 &  &	  \\
 22 & Ti 2 & 4395.03 & 1.08 & $-$0.540 & PTP01 & 4.90 &  2.22 &  &   0.10 &  88.0 &  &	  \\
 22 & Ti 2 & 4395.85 & 1.24 & $-$1.930 & PTP01 & 4.90 &  2.29 &  &   0.17 &  16.2 &  &	  \\
 22 & Ti 2 & 4399.77 & 1.24 & $-$1.190 & PTP01 & 4.90 &  2.29 &  &   0.17 &  51.4 &  &	   \\
 22 & Ti 2 & 4417.72 & 1.16 & $-$1.190 & PTP01 & 4.90 &  2.23 &  &   0.11 &  53.0 &  &	  \\
 22 & Ti 2 & 4418.33 & 1.24 & $-$1.970 & PTP01 & 4.90 &  2.23 &  &   0.11 &  13.3 &  &	  \\
 22 & Ti 2 & 4443.79 & 1.08 & $-$0.720 & PTP01 & 4.90 &  2.22 &  &   0.10 &  79.9 &  &	  \\
 22 & Ti 2 & 4444.56 & 1.12 & $-$2.240 & PTP01 & 4.90 &  2.29 &  &   0.17 &  11.7 &  &	  \\
 22 & Ti 2 & 4450.48 & 1.08 & $-$1.520 & PTP01 & 4.90 &  2.24 &  &   0.12 &  40.2 &  &	  \\
 22 & Ti 2 & 4464.45 & 1.16 & $-$1.810 & PTP01 & 4.90 &  2.33 &  &   0.21 &  26.0 &  &	  \\
 22 & Ti 2 & 4468.51 & 1.13 & $-$0.600 & BHN93 & 4.90 &  2.20 &  &   0.08 &  81.8 &  &	  \\
 22 & Ti 2 & 4470.86 & 1.16 & $-$2.020 & PTP01 & 4.90 &  2.07 &  &  $-$0.05 &  10.6 &  &	  \\
 22 & Ti 2 & 4501.27 & 1.12 & $-$0.770 & PTP01 & 4.90 &  2.23 &  &   0.11 &  77.5 &  &	  \\
 22 & Ti 2 & 4533.97 & 1.24 & $-$0.530 & PTP01 & 4.90 &  2.10 &  &  $-$0.02 &  76.0 &  &	  \\
 22 & Ti 2 & 4563.76 & 1.22 & $-$0.690 & PTP01 & 4.90 &  2.05 &  &  $-$0.07 &  67.7 &  &	  \\
 22 & Ti 2 & 4571.97 & 1.57 & $-$0.320 & PTP01 & 4.90 &  2.08 &  &  $-$0.04 &  67.7 &  &	  \\
 22 & Ti 2 & 5185.91 & 1.89 & $-$1.490 & PTP01 & 4.90 &  2.14 &  &   0.02 &   7.3 &  &	  \\
 22 & Ti 2 & 5188.70 & 1.58 & $-$1.050 & PTP01 & 4.90 &  2.20 &  &   0.08 &  36.4 &  &	  \\
 22 & Ti 2 & 5226.55 & 1.57 & $-$1.260 & PTP01 & 4.90 &  2.21 &  &   0.09 &  26.9 &  &	  \\
 22 & Ti 2 & 5336.79 & 1.58 & $-$1.590 & PTP01 & 4.90 &  2.20 &  &   0.08 &  14.3 &  &	  \\
 22 & Ti 2 & 5381.01 & 1.57 & $-$1.920 & PTP01 & 4.90 &  2.15 &  &   0.03 &   6.6 &  &	  \\
\multicolumn{13}{c}{ } \\
 23 & V  2 & 3530.76 & 1.07 & $-$0.600 & FW96 &  4.00 &  0.84 & & $-$0.38 & Syn &        & \\
 23 & V  2 & 3545.19 & 1.10 & $-$0.390 & FW96 &  4.00 &  0.84 & & $-$0.38 & Syn &         & \\
 23 & V  2 & 3592.03 & 1.10 & $-$0.370 & FW96 &  4.00 &  0.88 & & $-$0.34 & Syn &         & \\
 23 & V  2 & 4005.71 & 1.82 & $-$0.460 & FW96 &  4.00 &  1.01 & & $-$0.21 & Syn &         & \\
\multicolumn{13}{c}{ } \\
 24 & Cr 1 & 4254.33 & 0.00 & $-$0.114 & MFW88 & 5.64 &  2.22 &  &  $-$0.64 &  80.4 & $-$7.675 & $\Gamma_6$:ABO      \\
 24 & Cr 1 & 4274.80 & 0.00 & $-$0.230 & MFW88 & 5.64 &  2.16 &  &  $-$0.70 &  73.9 & $-$7.675 & the same     \\
 24 & Cr 1 & 5206.04 & 0.94 &  0.019 & MFW88 & 5.64 &  2.31 &  &  $-$0.55 &  45.1 & $-$7.597 & the same     \\
 24 & Cr 1 & 5345.81 & 1.00 & $-$0.980 & MFW88 & 5.64 &  2.43 &  &  $-$0.43 &   8.7 & $-$7.620 & the same     \\
 24 & Cr 1 & 5348.33 & 1.00 & $-$1.290 & FW96  & 5.64 &  2.34 &  &  $-$0.52 &   3.6 & $-$7.620 & the same     \\
 24 & Cr 1 & 5409.80 & 1.03 & $-$0.720 & MFW88 & 5.64 &  2.44 &  &  $-$0.42 &  14.1 & $-$7.620 & the same     \\
\multicolumn{13}{c}{ } \\
 25 & Mn 1 & 4030.75 & 0.00 & $-$0.470 & BBP84 &  5.37 &  1.53 & & $-$1.06 & Syn &  $-$7.552 & HFS:LGB03\\
    &      &         &      &        &       &       &       & &       &     &         & $\Gamma_6$:ABO \\
 25 & Mn 1 & 4033.06 & 0.00 & $-$0.620 & BBP84 &  5.37 &  1.53 & & $-$1.06 & Syn &  $-$7.552 & the same \\
 25 & Mn 1 & 4034.48 & 0.00 & $-$0.810 & BBP84 &  5.37 &  1.53 & & $-$1.06 & Syn &  $-$7.552 & the same \\
 25 & Mn 1 & 4041.35 & 2.11 &  0.280 & BBP84 &  5.37 &  1.89 & & $-$0.70 & Syn &  $-$7.701 & $\Gamma_6$:ABO\\
 25 & Mn 2 & 3460.31 & 1.81 & $-$0.640 & KG00  &  5.37 &  1.91 & & $-$0.68 & Syn &         & HFS:HSR99\\
 25 & Mn 2 & 3482.90 & 1.83 & $-$0.840 & KG00  &  5.37 &  1.94 & & $-$0.65 & Syn &         & HFS:HSR99\\
 25 & Mn 2 & 3488.67 & 1.85 & $-$0.950 & KG00  &  5.37 &  2.10 & & $-$0.49 & Syn &         & HFS:HSR99\\
\multicolumn{13}{c}{ } \\
 26 & Fe 1 & 3917.18 & 0.99 & $-$2.155 & OWL91 & 7.45 & 4.61 & 4.69 &  0.02 & 65.3 & $-$7.695 & $\Gamma_6$:ABO  \\
 26 & Fe 1 & 3949.95 & 2.18 & $-$1.251 & OWL91 & 7.45 & 4.39 & 4.47 & $-$0.19 & 36.8 & $-$7.820 & the same  \\
 26 & Fe 1 & 4005.24 & 1.56 & $-$0.580 & OWL91 & 7.45 & 4.66 & 4.72 &  0.07 & 96.1 & $-$7.620 & the same  \\
 26 & Fe 1 & 4132.06 & 1.61 & $-$0.675 & OWL91 & 7.45 & 4.61 & 4.68 &  0.02 & 94.3 & $-$7.620 & the same  \\
 26 & Fe 1 & 4132.90 & 2.85 & $-$1.006 & OWL91 & 7.45 & 4.53 & 4.61 & $-$0.06 & 19.4 & $-$7.659 & the same  \\
 26 & Fe 1 & 4143.87 & 1.56 & $-$0.511 & OWL91 & 7.45 & 4.53 & 4.59 & $-$0.06 & 98.0 & $-$7.636 & the same  \\
 26 & Fe 1 & 4147.67 & 1.49 & $-$2.074 & OWL91 & 7.45 & 4.68 & 4.76 &  0.10 & 40.3 & $-$7.648 & the same  \\
 26 & Fe 1 & 4202.03 & 1.49 & $-$0.708 & FMW88 & 7.45 & 4.64 & 4.67 &  0.05 & 98.4 & $-$7.648 & the same  \\
 26 & Fe 1 & 4216.18 & 0.00 & $-$3.356 & FMW88 & 7.45 & 4.66 & 4.75 &  0.08 & 69.5 & $-$7.797 & the same  \\
 26 & Fe 1 & 4250.79 & 1.56 & $-$0.714 & OWL91 & 7.45 & 4.69 & 4.73 &  0.10 & 95.9 & $-$7.648 & the same  \\
 26 & Fe 1 & 4260.47 & 2.40 &  0.080 & OWL91 & 7.45 & 4.45 & 4.51 & $-$0.14 & 86.1 & $-$7.274 & the same  \\
 26 & Fe 1 & 4415.12 & 1.61 & $-$0.615 & FMW88 & 7.45 & 4.56 & 4.61 & $-$0.02 & 99.0 & $-$7.652 & the same  \\
 26 & Fe 1 & 4427.31 & 0.05 & $-$2.924 & OWL91 & 7.45 & 4.77 & 4.86 &  0.18 & 87.6 & $-$7.813 & the same  \\
 26 & Fe 1 & 4602.94 & 1.49 & $-$2.209 & OWL91 & 7.45 & 4.55 & 4.63 & $-$0.04 & 36.3 & $-$7.790 & the same  \\
 26 & Fe 1 & 4647.43 & 2.95 & $-$1.351 & OWL91 & 7.45 & 4.49 & 4.57 & $-$0.10 &  7.9 & $-$7.685 & the same  \\
 26 & Fe 1 & 4966.09 & 3.33 & $-$0.871 & OWL91 & 7.45 & 4.59 & 4.69 &  0.00 & 11.4 & $-$7.218 & the same  \\
 26 & Fe 1 & 4994.13 & 0.92 & $-$2.970 & OWL91 & 7.45 & 4.63 & 4.72 &  0.04 & 31.4 & $-$7.744 & the same  \\
 26 & Fe 1 & 5001.86 & 3.88 &  0.010 & FMW88 & 7.45 & 4.57 & 4.67 & $-$0.02 & 13.9 & $-$7.273 & the same  \\
 26 & Fe 1 & 5014.94 & 3.94 & $-$0.303 & OWL91 & 7.45 & 4.59 & 4.68 &  0.00 &  8.7 & $-$7.268 & $\Gamma_6$:ABO  \\
 26 & Fe 1 & 5051.63 & 0.92 & $-$2.765 & OWL91 & 7.45 & 4.71 & 4.80 &  0.12 & 48.0 & $-$7.746 & the same  \\
 26 & Fe 1 & 5068.77 & 2.94 & $-$1.042 & OWL91 & 7.45 & 4.56 & 4.65 & $-$0.03 & 14.1 & $-$7.265 & the same  \\
 26 & Fe 1 & 5150.84 & 0.99 & $-$3.040 & OWL91 & 7.45 & 4.67 & 4.75 &  0.08 & 23.0 & $-$7.742 & the same  \\
 26 & Fe 1 & 5166.28 & 0.00 & $-$4.200 & OWL91 & 7.45 & 4.69 & 4.78 &  0.10 & 33.5 & $-$7.826 & the same  \\
 26 & Fe 1 & 5171.60 & 1.49 & $-$1.720 & OWL91 & 7.45 & 4.81 & 4.89 &  0.22 & 63.8 & $-$7.687 & the same  \\
 26 & Fe 1 & 5192.34 & 3.00 & $-$0.421 & OWL91 & 7.45 & 4.53 & 4.61 & $-$0.06 & 34.7 & $-$7.266 & the same  \\
 26 & Fe 1 & 5194.94 & 1.56 & $-$2.020 & OWL91 & 7.45 & 4.67 & 4.75 &  0.08 & 41.0 & $-$7.680 & the same  \\
 26 & Fe 1 & 5216.27 & 1.61 & $-$2.080 & OWL91 & 7.45 & 4.69 & 4.77 &  0.10 & 37.3 & $-$7.674 & the same  \\
 26 & Fe 1 & 5281.79 & 3.04 & $-$0.830 & OWL91 & 7.45 & 4.65 & 4.73 &  0.06 & 18.4 & $-$7.266 & the same  \\
 26 & Fe 1 & 5283.62 & 3.24 & $-$0.520 & OWL91 & 7.45 & 4.48 & 4.57 & $-$0.11 & 21.8 & $-$7.221 & the same  \\
 26 & Fe 1 & 5324.18 & 3.21 & $-$0.100 & BKK91 & 7.45 & 4.35 & 4.44 & $-$0.24 & 35.1 & $-$7.235 & the same  \\
 26 & Fe 1 & 5339.93 & 3.27 & $-$0.720 & OWL91 & 7.45 & 4.48 & 4.57 & $-$0.11 & 14.5 & $-$7.221 & the same  \\
 26 & Fe 1 & 5364.87 & 4.45 &  0.228 & OWL91 & 7.45 & 4.47 & 4.58 & $-$0.12 &  5.3 & $-$7.136 & the same  \\
 26 & Fe 1 & 5367.47 & 4.41 &  0.440 & OWL91 & 7.45 & 4.56 & 4.67 & $-$0.03 &  8.9 & $-$7.153 & the same  \\
 26 & Fe 1 & 5369.96 & 4.37 &  0.536 & OWL91 & 7.45 & 4.58 & 4.69 & $-$0.01 & 12.3 & $-$7.179 & the same  \\
 26 & Fe 1 & 5383.37 & 4.31 &  0.645 & OWL91 & 7.45 & 4.57 & 4.69 & $-$0.02 & 16.8 & $-$7.219 & the same  \\
 26 & Fe 1 & 5393.17 & 3.24 & $-$0.720 & BKK91 & 7.45 & 4.56 & 4.64 & $-$0.03 & 15.2 & $-$7.235 & the same  \\
 26 & Fe 1 & 5410.91 & 4.47 &  0.398 & OWL91 & 7.45 & 4.62 & 4.73 &  0.03 &  7.5 & $-$7.132 & the same  \\
 26 & Fe 1 & 5415.20 & 4.39 &  0.642 & OWL91 & 7.45 & 4.52 & 4.63 & $-$0.07 & 13.4 & $-$7.182 & the same  \\
 26 & Fe 1 & 5434.52 & 1.01 & $-$2.130 & OWL91 & 7.45 & 4.77 & 4.85 &  0.18 & 80.4 & $-$7.749 & the same  \\
 26 & Fe 1 & 5445.04 & 4.39 & $-$0.020 & FMW88 & 7.45 & 4.58 & 4.69 & $-$0.01 &  5.7 & $-$7.189 & the same  \\
 26 & Fe 1 & 5506.78 & 0.99 & $-$2.797 & OWL91 & 7.45 & 4.70 & 4.79 &  0.11 & 44.6 & $-$7.753 & the same  \\
 26 & Fe 1 & 5586.76 & 3.37 & $-$0.100 & BKK91 & 7.45 & 4.42 & 4.51 & $-$0.17 & 29.4 & $-$7.221 & the same  \\
 26 & Fe 1 & 5615.64 & 3.33 &  0.050 & BKK91 & 7.45 & 4.41 & 4.50 & $-$0.18 & 37.2 & $-$7.234 & the same  \\
 26 & Fe 1 & 6136.62 & 2.45 & $-$1.410 & OWL91 & 7.45 & 4.50 & 4.58 & $-$0.09 & 25.2 & $-$7.609 & the same  \\
 26 & Fe 1 & 6137.69 & 2.59 & $-$1.350 & OWL91 & 7.45 & 4.46 & 4.54 & $-$0.13 & 19.1 & $-$7.589 & the same  \\
 26 & Fe 1 & 6191.56 & 2.43 & $-$1.417 & OWL91 & 7.45 & 4.55 & 4.63 & $-$0.04 & 24.4 & $-$7.615 & the same  \\
 26 & Fe 1 & 6393.60 & 2.43 & $-$1.570 & OWL91 & 7.45 & 4.44 & 4.52 & $-$0.14 & 20.0 & $-$7.622 & the same  \\
 26 & Fe 1 & 6400.00 & 3.60 & $-$0.290 & BKK91 & 7.45 & 4.46 & 4.55 & $-$0.13 & 14.0 & $-$7.232 & the same  \\
 26 & Fe 1 & 6430.85 & 2.18 & $-$1.950 & OWL91 & 7.45 & 4.63 & 4.71 &  0.04 & 18.0 & $-$7.704 & the same  \\
 26 & Fe 2 & 4508.29 & 2.86 & $-$2.440 & MB09  & 7.45 & 4.64 & 4.64 & $-$0.03 & 22.6 & $-$7.870 & the same  \\
 26 & Fe 2 & 4515.34 & 2.84 & $-$2.600 & MB09  & 7.45 & 4.81 & 4.81 &  0.14 & 21.2 & $-$7.880 & the same  \\
 26 & Fe 2 & 4520.22 & 2.81 & $-$2.650 & MB09  & 7.45 & 4.61 & 4.61 & $-$0.06 & 17.6 & $-$7.880 & the same  \\
 26 & Fe 2 & 4923.93 & 2.89 & $-$1.260 & MB09  & 7.45 & 4.59 & 4.58 & $-$0.07 & 68.5 & $-$7.890 & the same  \\
 26 & Fe 2 & 5018.44 & 2.89 & $-$1.100 & MB09  & 7.45 & 4.64 & 4.63 & $-$0.02 & 77.9 & $-$7.890 & the same  \\
 26 & Fe 2 & 5197.58 & 3.23 & $-$2.220 & MB09  & 7.45 & 4.69 & 4.69 &  0.03 & 14.6 & $-$7.880 & the same  \\
 26 & Fe 2 & 5234.62 & 3.22 & $-$2.180 & MB09  & 7.45 & 4.70 & 4.70 &  0.03 & 17.6 & $-$7.880 & the same \\
 26 & Fe 2 & 5284.11 & 2.89 & $-$3.110 & MB09  & 7.45 & 4.73 & 4.73 &  0.06 &  5.6 & $-$7.890 & the same \\
\multicolumn{13}{c}{ } \\
 27 & Co 1 & 3412.33 & 0.51 &  0.030 & CSS82 &  4.92 &  1.87 & & $-$0.27 & Syn &  $-$7.666 & HFS:P96\\
    &      &         &      &        &       &       &       & &       &     &         & $\Gamma_6$:ABO \\
 27 & Co 1 & 3417.16 & 0.58 & $-$0.470 & CSS82 &  4.92 &  1.97 & & $-$0.17 & Syn &  $-$7.657 & $\Gamma_6$:ABO \\
 27 & Co 1 & 3489.40 & 0.92 &  0.150 & CSS82 &  4.92 &  1.86 & & $-$0.28 & Syn &  $-$7.610 & HFS:P96\\
    &      &         &      &        &       &       &       & &       &     &         & $\Gamma_6$:ABO \\
% 27 & Co 1 & 3842.05 & 0.92 & $-$0.770 & CSS82 &  4.92 &  2.12 & & $-$0.02 & Syn &  $-$7.610 & \\
% 27 & Co 1 & 3845.46 & 0.92 &  0.010 & CSS82 &  4.92 &  1.99 & & $-$0.15 & Syn &  $-$7.610 & \\
 27 & Co 1 & 3894.07 & 1.05 &  0.090 & NKW99 &  4.92 &  1.98 & & $-$0.16 & Syn &  $-$7.648 & HFS:P96\\
    &      &         &      &        &       &       &       & &       &     &         & $\Gamma_6$:ABO \\
% 27 & Co 1 & 3995.30 & 0.92 & $-$0.140 & NKW99 &  4.92 &  1.95 & & $-$0.19 & Syn &  $-$7.724 & \\
 27 & Co 1 & 4118.77 & 1.05 & $-$0.470 & NKW99 &  4.92 &  2.05 & & $-$0.09 & Syn &  $-$7.710 & $\Gamma_6$:ABO \\
 27 & Co 1 & 4121.31 & 0.92 & $-$0.300 & NKW99 &  4.92 &  2.05 & & $-$0.09 & Syn &  $-$7.724 & HFS:P96\\
    &      &         &      &        &       &       &       & &       &     &         & $\Gamma_6$:ABO \\
\multicolumn{13}{c}{ } \\
 28 & Ni 1 & 3413.47 & 0.16 & $-$1.480 & HS80  &  6.23 &  3.18 & & $-$0.27 & Syn &  $-$7.690 & $\Gamma_6$:ABO \\
 28 & Ni 1 & 3413.93 & 0.11 & $-$1.720 & FMW88 &  6.23 &  3.26 & & $-$0.19 & Syn &  $-$7.785 & the same \\
 28 & Ni 1 & 3519.76 & 0.28 & $-$1.420 & BBP89 &  6.23 &  3.08 & & $-$0.37 & Syn &  $-$7.689 & the same \\
 28 & Ni 1 & 3783.52 & 0.42 & $-$1.310 & HS80  &  6.23 &  3.00 & & $-$0.45 & Syn &  $-$7.780 & the same \\
 28 & Ni 1 & 3807.14 & 0.42 & $-$1.220 & BBP89 &  6.23 &  3.00 & & $-$0.45 & Syn &  $-$7.694 & the same \\
 28 & Ni 1 & 3858.29 & 0.42 & $-$0.950 & BBP89 &  6.23 &  2.98 & & $-$0.47 & Syn &  $-$7.700 & the same \\
 28 & Ni 1 & 5035.37 & 3.63 &  0.290 & WL97a &  6.23 &  3.09 & & $-$0.36 & Syn &  $-$7.231 & $\Gamma_6$:ABO \\
 28 & Ni 1 & 5476.90 & 1.83 & $-$0.890 & FMW88 &  6.23 &  3.20 & & $-$0.25 & Syn &         & \\
\multicolumn{13}{c}{ } \\
 30 & Zn 1 & 4722.16 & 4.01 & $-$0.390 & BG80 &  4.62 &  1.82 & & $-$0.02 & Syn &     & \\
 30 & Zn 1 & 4810.54 & 4.06 & $-$0.170 & BG80 &  4.62 &  1.84 & &  0.00 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 38 & Sr 2 & 4077.72 & 0.00 &  0.150 & RCW80 &  2.92 & $-$0.01 & $-$0.16 & $-$0.30 & Syn &  $-$7.792 & HFS:BBH83\\
    &      &         &      &        &       &       &       & &       &     &         & $\Gamma_6$:MZG08 \\
 38 & Sr 2 & 4215.54 & 0.00 & $-$0.170 & RCW80 &  2.92 & $-$0.01 & $-$0.16 & $-$0.30 & Syn &  $-$7.792 & the same\\
\multicolumn{13}{c}{ } \\
 39 & Y  2 & 3549.01 & 0.13 & $-$0.280 & HLG82 &  2.21 & $-$0.74 & & $-$0.17 & Syn &     & \\
 39 & Y  2 & 3600.74 & 0.18 &  0.280 & HLG82 &  2.21 & $-$0.67 & & $-$0.10 & Syn &     & \\
 39 & Y  2 & 3611.04 & 0.13 &  0.010 & HLG82 &  2.21 & $-$0.73 & & $-$0.16 & Syn &     & \\
 39 & Y  2 & 3774.33 & 0.13 &  0.210 & HLG82 &  2.21 & $-$0.67 & & $-$0.10 & Syn &     & \\
 39 & Y  2 & 3788.69 & 0.10 & $-$0.070 & HLG82 &  2.21 & $-$0.66 & & $-$0.09 & Syn &     & \\
 39 & Y  2 & 3950.35 & 0.10 & $-$0.490 & HLG82 &  2.21 & $-$0.56 & &  0.01 & Syn &     & \\
 39 & Y  2 & 4883.68 & 1.08 &  0.070 & HLG82 &  2.21 & $-$0.66 & & $-$0.09 & Syn &     & \\
 39 & Y  2 & 5087.43 & 1.08 & $-$0.170 & HLG82 &  2.21 & $-$0.75 & & $-$0.18 & Syn &     & \\
 39 & Y  2 & 5205.73 & 1.03 & $-$0.340 & HLG82 &  2.21 & $-$0.75 & & $-$0.18 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 40 & Zr 2 & 3404.83 & 0.36 & $-$0.490 & LNA06 &  2.58 & $-$0.01 & 0.07 &  0.26 & Syn &     & \\
 40 & Zr 2 & 3430.53 & 0.47 & $-$0.160 & LNA06 &  2.58 & $-$0.03 & 0.08 &  0.28 & Syn &     & \\
 40 & Zr 2 & 3457.56 & 0.56 & $-$0.470 & MBM06 &  2.58 &  0.06 & 0.14 &  0.34 & Syn &     & \\
 40 & Zr 2 & 3479.39 & 0.71 & $-$0.180 & LNA06 &  2.58 &  0.02 & 0.16 &  0.36 & Syn &     & \\
 40 & Zr 2 & 3499.57 & 0.41 & $-$1.060 & LNA06 &  2.58 & $-$0.02 & 0.02 &  0.22 & Syn &     & \\
 40 & Zr 2 & 3505.67 & 0.16 & $-$0.390 & LNA06 &  2.58 & $-$0.02 & 0.03 &  0.23 & Syn &     & \\
 40 & Zr 2 & 3551.95 & 0.09 & $-$0.360 & LNA06 &  2.58 &  0.01 & 0.07 &  0.27 & Syn &     & \\
 40 & Zr 2 & 3573.08 & 0.32 & $-$0.910 & MBM06 &  2.58 &  0.09 & 0.18 &  0.38 & Syn &     & \\
 40 & Zr 2 & 3766.82 & 0.41 & $-$0.830 & LNA06 &  2.58 &  0.12 & 0.16 &  0.36 & Syn &     & \\
 40 & Zr 2 & 3998.97 & 0.56 & $-$0.520 & LNA06 &  2.58 &  0.07 & 0.15 &  0.35 & Syn &     & \\
 40 & Zr 2 & 4161.21 & 0.71 & $-$0.590 & LNA06 &  2.58 &  0.08 & 0.16 &  0.36 & Syn &     & \\
 40 & Zr 2 & 4208.98 & 0.71 & $-$0.510 & LNA06 &  2.58 &  0.07 & 0.15 &  0.35 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 42 & Mo 1 & 3864.11 & 0.00 & $-$0.010 & FW96  &  1.92 & $-$0.49 & &  0.37 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 46 & Pd 1 & 3404.58 & 0.81 &  0.330 & XSD06 &  1.66 & $-$0.72 & &  0.40 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 56 & Ba 2 & 4554.03 & 0.00 &  0.167 & RCW80 &  2.17 & $-$0.16 & $-$0.25 &  0.36 & Syn &  $-$7.732 & HFS:M98\\
    &      &         &      &        &       &       &       & &       &     &         & $\Gamma_6$:MZG08 \\
 56 & Ba 2 & 5853.67 & 0.60 & $-$1.000 & RCW80 &  2.17 & $-$0.29 & $-$0.23 &  0.38 & Syn &  $-$7.584 & $\Gamma_6$:ABO \\
 56 & Ba 2 & 6141.71 & 0.70 & $-$0.076 & RCW80 &  2.17 & $-$0.34 & $-$0.36 &  0.25 & Syn &  $-$7.584 & $\Gamma_6$:ABO \\
 56 & Ba 2 & 6496.90 & 0.60 & $-$0.377 & RCW80 &  2.17 & $-$0.28 & $-$0.32 &  0.29 & Syn &  $-$7.584 & $\Gamma_6$:ABO \\  
\multicolumn{13}{c}{ } \\
 57 & La 2 & 3849.01 & 0.00 & $-$0.450 & LBS01 &  1.14 & $-$1.11 & &  0.53 & Syn &     & HFS:LBS01\\
 57 & La 2 & 3949.10 & 0.40 &  0.490 & LBS01 &  1.14 & $-$1.13 & &  0.51 & Syn &     & HFS:LBS01\\
 57 & La 2 & 3988.51 & 0.40 &  0.210 & LBS01 &  1.14 & $-$1.13 & &  0.51 & Syn &     & HFS:LBS01\\
 57 & La 2 & 3995.74 & 0.17 & $-$0.060 & LBS01 &  1.14 & $-$1.09 & &  0.55 & Syn &     & HFS:LBS01\\
 57 & La 2 & 4077.34 & 0.24 & $-$0.060 & LBS01 &  1.14 & $-$1.11 & &  0.53 & Syn &     & HFS:LBS01\\
 57 & La 2 & 4086.71 & 0.00 & $-$0.070 & LBS01 &  1.14 & $-$1.06 & &  0.58 & Syn &     & HFS:LBS01\\
 57 & La 2 & 4196.55 & 0.32 & $-$0.300 & LBS01 &  1.14 & $-$1.11 & &  0.53 & Syn &     & HFS:LBS01\\
 57 & La 2 & 4920.98 & 0.13 & $-$0.580 & LBS01 &  1.14 & $-$1.08 & &  0.56 & Syn &     & HFS:LBS01\\
\multicolumn{13}{c}{ } \\
 58 & Ce 2 & 3942.15 & 0.00 & $-$0.220 & LSC09 &  1.61 & $-$0.60 & &  0.57 & Syn &     & \\
 58 & Ce 2 & 3992.38 & 0.45 & $-$0.220 & LSC09 &  1.61 & $-$0.57 & &  0.60 & Syn &     & \\
 58 & Ce 2 & 3993.82 & 0.91 &  0.290 & LSC09 &  1.61 & $-$0.59 & &  0.58 & Syn &     & \\
 58 & Ce 2 & 3999.24 & 0.30 &  0.060 & LSC09 &  1.61 & $-$0.67 & &  0.50 & Syn &     & \\
 58 & Ce 2 & 4073.47 & 0.48 &  0.210 & LSC09 &  1.61 & $-$0.69 & &  0.48 & Syn &     & \\
 58 & Ce 2 & 4075.70 & 0.70 &  0.230 & LSC09 &  1.61 & $-$0.68 & &  0.49 & Syn &     & \\
 58 & Ce 2 & 4083.22 & 0.70 &  0.270 & LSC09 &  1.61 & $-$0.58 & &  0.59 & Syn &     & \\
 58 & Ce 2 & 4127.36 & 0.68 &  0.310 & LSC09 &  1.61 & $-$0.70 & &  0.47 & Syn &     & \\
 58 & Ce 2 & 4137.64 & 0.52 &  0.400 & LSC09 &  1.61 & $-$0.55 & &  0.62 & Syn &     & \\
 58 & Ce 2 & 4222.60 & 0.12 & $-$0.150 & LSC09 &  1.61 & $-$0.59 & &  0.58 & Syn &     & \\
 58 & Ce 2 & 4562.36 & 0.48 &  0.210 & LSC09 &  1.61 & $-$0.68 & &  0.49 & Syn &     & \\
 58 & Ce 2 & 4628.16 & 0.52 &  0.140 & LSC09 &  1.61 & $-$0.63 & &  0.54 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 59 & Pr 2 & 4143.12 & 0.37 &  0.610 & ILW01 &  0.76 & $-$1.21 & $-$1.13 &  0.89 & Syn &     & HFS:G89\\
 59 & Pr 2 & 4179.40 & 0.20 &  0.480 & ILW01 &  0.76 & $-$1.09 & $-$1.01 &  1.01 & Syn &     & HFS:G89\\
 59 & Pr 2 & 4408.82 & 0.00 &  0.180 & ILW01 &  0.76 & $-$1.14 & $-$1.07 &  0.95 & Syn &     & HFS:G89\\
\multicolumn{13}{c}{ } \\
 60 & Nd 2 & 3784.25 & 0.38 &  0.150 & DLS03 &  1.45 & $-$0.78 & &  0.55 & Syn &     & \\
 60 & Nd 2 & 3838.98 & 0.00 & $-$0.240 & DLS03 &  1.45 & $-$0.68 & &  0.65 & Syn &     & \\
 60 & Nd 2 & 3900.22 & 0.47 &  0.100 & DLS03 &  1.45 & $-$0.70 & &  0.63 & Syn &     & \\
 60 & Nd 2 & 3941.51 & 0.06 & $-$0.020 & DLS03 &  1.45 & $-$0.64 & &  0.69 & Syn &     & \\
 60 & Nd 2 & 3990.10 & 0.47 &  0.130 & DLS03 &  1.45 & $-$0.68 & &  0.65 & Syn &     & \\
 60 & Nd 2 & 3991.74 & 0.00 & $-$0.260 & DLS03 &  1.45 & $-$0.63 & &  0.70 & Syn &     & \\
 60 & Nd 2 & 4012.70 & 0.00 & $-$0.600 & DLS03 &  1.45 & $-$0.58 & &  0.75 & Syn &     & \\
 60 & Nd 2 & 4018.82 & 0.06 & $-$0.850 & DLS03 &  1.45 & $-$0.58 & &  0.75 & Syn &     & \\
 60 & Nd 2 & 4021.33 & 0.32 & $-$0.100 & DLS03 &  1.45 & $-$0.53 & &  0.80 & Syn &     & \\
 60 & Nd 2 & 4023.00 & 0.56 &  0.040 & DLS03 &  1.45 & $-$0.48 & &  0.85 & Syn &     & \\
 60 & Nd 2 & 4059.95 & 0.20 & $-$0.520 & DLS03 &  1.45 & $-$0.58 & &  0.75 & Syn &     & \\
 60 & Nd 2 & 4061.08 & 0.47 &  0.550 & DLS03 &  1.45 & $-$0.61 & &  0.72 & Syn &     & \\
 60 & Nd 2 & 4069.26 & 0.06 & $-$0.570 & DLS03 &  1.45 & $-$0.61 & &  0.72 & Syn &     & \\
 60 & Nd 2 & 4109.07 & 0.06 & $-$0.160 & DLS03 &  1.45 & $-$0.63 & &  0.70 & Syn &     & \\
 60 & Nd 2 & 4109.45 & 0.32 &  0.350 & DLS03 &  1.45 & $-$0.63 & &  0.70 & Syn &     & \\
 60 & Nd 2 & 4135.32 & 0.63 & $-$0.070 & DLS03 &  1.45 & $-$0.53 & &  0.80 & Syn &     & \\
 60 & Nd 2 & 4156.08 & 0.18 &  0.160 & DLS03 &  1.45 & $-$0.63 & &  0.70 & Syn &     & \\
 60 & Nd 2 & 4177.33 & 0.06 & $-$0.100 & DLS03 &  1.45 & $-$0.62 & &  0.71 & Syn &     & \\
 60 & Nd 2 & 4385.66 & 0.20 & $-$0.300 & DLS03 &  1.45 & $-$0.62 & &  0.71 & Syn &     & \\
 60 & Nd 2 & 4462.98 & 0.56 &  0.040 & DLS03 &  1.45 & $-$0.48 & &  0.85 & Syn &     & \\
 60 & Nd 2 & 4706.54 & 0.00 & $-$0.710 & DLS03 &  1.45 & $-$0.56 & &  0.77 & Syn &     & \\
 60 & Nd 2 & 5212.35 & 0.20 & $-$0.960 & DLS03 &  1.45 & $-$0.65 & &  0.68 & Syn &     & \\
 60 & Nd 2 & 5255.51 & 0.20 & $-$0.670 & DLS03 &  1.45 & $-$0.53 & &  0.80 & Syn &     & \\
 60 & Nd 2 & 5319.82 & 0.55 & $-$0.140 & DLS03 &  1.45 & $-$0.67 & &  0.66 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 62 & Sm 2 & 3568.26 & 0.48 &  0.290 & LDS06 &  1.00 & $-$1.09 & &  0.69 & Syn &     & \\
 62 & Sm 2 & 3760.71 & 0.19 & $-$0.400 & LDS06 &  1.00 & $-$0.89 & &  0.89 & Syn &     & \\
 62 & Sm 2 & 4318.94 & 0.28 & $-$0.250 & LDS06 &  1.00 & $-$0.86 & &  0.92 & Syn &     & \\
 62 & Sm 2 & 4434.32 & 0.38 & $-$0.070 & LDS06 &  1.00 & $-$0.96 & &  0.82 & Syn &     & \\
 62 & Sm 2 & 4467.34 & 0.66 &  0.150 & LDS06 &  1.00 & $-$0.84 & &  0.94 & Syn &     & \\
 62 & Sm 2 & 4519.63 & 0.54 & $-$0.350 & LDS06 &  1.00 & $-$0.86 & &  0.92 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 63 & Eu 2 & 3819.67 & 0.00 &  0.510 & LWD01 &  0.52 & $-$1.32 & $-$1.17 &  1.09 & Syn &     & HFS:LWD01\\
 63 & Eu 2 & 3907.11 & 0.21 &  0.170 & LWD01 &  0.52 & $-$1.27 & $-$1.07 &  1.19 & Syn &     & HFS:LWD01\\
 63 & Eu 2 & 4129.72 & 0.00 &  0.220 & LWD01 &  0.52 & $-$1.27 & $-$1.12 &  1.14 & Syn &     & HFS:LWD01\\
 63 & Eu 2 & 4205.02 & 0.00 &  0.210 & LWD01 &  0.52 & $-$1.29 & $-$1.14 &  1.12 & Syn &     & HFS:LWD01\\
\multicolumn{13}{c}{ } \\
 64 & Gd 2 & 3358.62 & 0.03 &  0.250 & DLS06 &  1.11 & $-$0.79 & &  0.88 & Syn &     & \\
 64 & Gd 2 & 3422.46 & 0.24 &  0.710 & DLS06 &  1.11 & $-$0.63 & &  1.04 & Syn &     & \\
 64 & Gd 2 & 3481.80 & 0.49 &  0.110 & DLS06 &  1.11 & $-$0.83 & &  0.84 & Syn &     & \\
 64 & Gd 2 & 3768.40 & 0.08 &  0.210 & DLS06 &  1.11 & $-$0.69 & &  0.98 & Syn &     & \\
 64 & Gd 2 & 3796.38 & 0.03 &  0.020 & DLS06 &  1.11 & $-$0.66 & &  1.01 & Syn &     & \\
 64 & Gd 2 & 4085.57 & 0.73 & $-$0.010 & DLS06 &  1.11 & $-$0.77 & &  0.90 & Syn &     & \\
 64 & Gd 2 & 4130.37 & 0.73 &  0.140 & DLS06 &  1.11 & $-$0.73 & &  0.94 & Syn &     & \\
 64 & Gd 2 & 4215.02 & 0.43 & $-$0.440 & DLS06 &  1.11 & $-$0.66 & &  1.01 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 65 & Tb 2 & 3509.14 & 0.00 &  0.700 & LWC01 &  0.28 & $-$1.53 & &  0.97 & Syn &     & HFS:LWB01\\
 65 & Tb 2 & 3848.73 & 0.00 &  0.280 & LWC01 &  0.28 & $-$1.49 & &  1.01 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 66 & Dy 2 & 3407.80 & 0.00 &  0.180 & WLN00 &  1.13 & $-$0.68 & &  0.97 & Syn &     & \\
 66 & Dy 2 & 3445.57 & 0.00 & $-$0.150 & WLN00 &  1.13 & $-$0.56 & &  1.09 & Syn &     & \\
 66 & Dy 2 & 3454.32 & 0.10 & $-$0.140 & WLN00 &  1.13 & $-$0.61 & &  1.04 & Syn &     & \\
 66 & Dy 2 & 3460.97 & 0.00 & $-$0.070 & WLN00 &  1.13 & $-$0.56 & &  1.09 & Syn &     & \\
 66 & Dy 2 & 3506.81 & 0.10 & $-$0.600 & WLN00 &  1.13 & $-$0.71 & &  0.94 & Syn &     & \\
 66 & Dy 2 & 3531.71 & 0.00 &  0.770 & WLN00 &  1.13 & $-$0.63 & &  1.02 & Syn &     & \\
 66 & Dy 2 & 3534.96 & 0.10 & $-$0.040 & WLN00 &  1.13 & $-$0.51 & &  1.14 & Syn &     & \\
 66 & Dy 2 & 3536.02 & 0.54 &  0.530 & WLN00 &  1.13 & $-$0.64 & &  1.01 & Syn &     & \\
 66 & Dy 2 & 3538.52 & 0.00 & $-$0.020 & WLN00 &  1.13 & $-$0.64 & &  1.01 & Syn &     & \\
 66 & Dy 2 & 3550.22 & 0.59 &  0.270 & WLN00 &  1.13 & $-$0.54 & &  1.11 & Syn &     & \\
 66 & Dy 2 & 3563.15 & 0.10 & $-$0.360 & WLN00 &  1.13 & $-$0.59 & &  1.06 & Syn &     & \\
 66 & Dy 2 & 3694.81 & 0.10 & $-$0.110 & WLN00 &  1.13 & $-$0.66 & &  0.99 & Syn &     & \\
 66 & Dy 2 & 3944.68 & 0.00 &  0.110 & WLN00 &  1.13 & $-$0.57 & &  1.08 & Syn &     & \\
 66 & Dy 2 & 3996.69 & 0.59 & $-$0.260 & WLN00 &  1.13 & $-$0.57 & &  1.08 & Syn &     & \\
 66 & Dy 2 & 4077.96 & 0.10 & $-$0.040 & WLN00 &  1.13 & $-$0.51 & &  1.14 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 67 & Ho 2 & 3398.94 & 0.00 &  0.410 & LSC04 &  0.51 & $-$1.37 & &  0.90 & Syn &     & HFS:LSC04\\
 67 & Ho 2 & 3416.44 & 0.08 &  0.260 & LSC04 &  0.51 & $-$1.45 & &  0.82 & Syn &     & HFS:LSC04\\
 67 & Ho 2 & 3456.00 & 0.00 &  0.760 & LSC04 &  0.51 & $-$1.30 & &  0.97 & Syn &     & HFS:LSC04\\
 67 & Ho 2 & 3796.67 & 0.00 &  0.160 & LSC04 &  0.51 & $-$1.19 & &  1.08 & Syn &     & HFS:LSC04\\
 67 & Ho 2 & 3810.00 & 0.00 &  0.190 & LSC04 &  0.51 & $-$1.22 & &  1.05 & Syn &     & HFS:LSC04\\
\multicolumn{13}{c}{ } \\
 68 & Er 2 & 3499.10 & 0.06 &  0.290 & LSC08 &  0.96 & $-$0.89 & &  0.93 & Syn &     & \\
 68 & Er 2 & 3559.89 & 0.00 & $-$0.690 & LSC08 &  0.96 & $-$0.90 & &  0.92 & Syn &     & \\
 68 & Er 2 & 3616.57 & 0.00 & $-$0.310 & LSC08 &  0.96 & $-$0.73 & &  1.09 & Syn &     & \\
 68 & Er 2 & 3633.54 & 0.00 & $-$0.530 & LSC08 &  0.96 & $-$0.91 & &  0.91 & Syn &     & \\
 68 & Er 2 & 3692.65 & 0.06 &  0.280 & LSC08 &  0.96 & $-$0.79 & &  1.03 & Syn &     & \\
 68 & Er 2 & 3729.52 & 0.00 & $-$0.590 & LSC08 &  0.96 & $-$0.66 & &  1.16 & Syn &     & \\
 68 & Er 2 & 3786.84 & 0.00 & $-$0.520 & LSC08 &  0.96 & $-$0.73 & &  1.09 & Syn &     & \\
 68 & Er 2 & 3830.48 & 0.00 & $-$0.220 & LSC08 &  0.96 & $-$0.84 & &  0.98 & Syn &     & \\
 68 & Er 2 & 3896.23 & 0.06 & $-$0.120 & LSC08 &  0.96 & $-$0.89 & &  0.93 & Syn &     & \\
 68 & Er 2 & 3906.31 & 0.00 &  0.120 & LSC08 &  0.96 & $-$0.74 & &  1.08 & Syn &     & \\
 68 & Er 2 & 3938.63 & 0.00 & $-$0.520 & KB95  &  0.96 & $-$0.76 & &  1.06 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 69 & Tm 2 & 3462.20 & 0.00 &  0.030 & WL97b &  0.14 & $-$1.68 & &  0.96 & Syn &     & \\
 69 & Tm 2 & 3700.26 & 0.03 & $-$0.380 & WL97b &  0.14 & $-$1.61 & &  1.03 & Syn &     & \\
 69 & Tm 2 & 3701.36 & 0.00 & $-$0.540 & WL97b &  0.14 & $-$1.63 & &  1.01 & Syn &     & \\
 69 & Tm 2 & 3795.76 & 0.03 & $-$0.230 & WL97b &  0.14 & $-$1.55 & &  1.09 & Syn &     & \\
 69 & Tm 2 & 3848.02 & 0.00 & $-$0.140 & WL97b &  0.14 & $-$1.76 & &  0.88 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 70 & Yb 2 & 3694.19 & 0.00 & $-$0.300 & BDM98 &  0.86 & $-$1.03 & &  0.89 & Syn &     & HFS:MGH94\\
\multicolumn{13}{c}{ } \\
 72 & Hf 2 & 3399.79 & 0.00 & $-$0.570 & LDL07 &  0.88 & $-$1.32 & &  0.58 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 76 & Os 1 & 4260.85 & 0.00 & $-$1.430 & IAN03 &  1.45 & $-$0.17 & &  1.16 & Syn &     & \\
\multicolumn{13}{c}{ } \\
 77 & Ir 1 & 3513.65 & 0.00 & $-$1.210 & IAN03 &  1.38 & $-$0.04 & &  1.36 & Syn &     & HFS:CSB05\\
 77 & Ir 1 & 3800.12 & 0.00 & $-$1.440 & IAN03 &  1.38 & $-$0.05 & &  1.35 & Syn &     & HFS:CSB05\\
\multicolumn{13}{c}{ } \\
 90 & Th 2 & 4019.13 & 0.00 & $-$0.228 & NZL02 &  0.08 & $-$1.67 & &  1.03 & Syn &     & \\
% 90 & Th 2 & 3741.18 & 0.19 & $-$0.170 & NZL02 &  0.08 & $-$1.87 & &  0.83 & Syn &     & \\
\hline 
\end{tabular}
%\end{tabular}
%%\end{center}
\par
%\end{table}