\begin{table}%t4 
\caption{\label{tab:drz_cti_coef}Fitted coefficients for the $r_{\rm g}$-dependent CTI-ellipticity model (\ref{eq:starcti_rgfitted}) in the resampled \textit{DRZ} frames.}
\small%\centering
\par
\begin{tabular}{crrr}
\hline\hline\noalign{\smallskip}
$j$ & \multicolumn{1}{c}{$a_j$} & \multicolumn{1}{c}{$b_j$} & \multicolumn{1}{c}{$c_j$} \\
\hline\noalign{\smallskip}
0 & $- 5.623 \times10^{-3}$ & $8.371\times10^{-1}$ & $1.417\times10^{-3}$\\
1 & $9.573\times10^{-3}$ & $- 1.372\times10^{-1}$ & $6.182\times10^{-2}$\\
2 & $- 8.307\times10^{-4}$ & $1.037\times10^{-2}$ & $- 6.410\times10^{-3}$\\
3 & $2.739\times10^{-5}$ & $- 2.597\times10^{-4}$ & $2.155\times10^{-4}$\\
\hline
\end{tabular}
\end{table}