\begin{table}%t1
\caption{\label{table:logobs}ISAAC/VLT journal of observations. }
 %\centering
\par
\begin{tabular}{lcccccl}
 \hline
 \hline
 \noalign{\smallskip}
Source  & $K$ mag &  Start time (UT) &  Exp. time (s) & {\it S/N} & IR Counterpart & Reference\\
             %\noalign{\smallskip}
              \hline
            % \noalign{\smallskip}
            IGR~J16358-4726 & 12.6  & 2007-04-05 08:26   & 480 &  120 &  2MASS~J16355369-4725398& Kouveliotou et al. (2003)\\
            IGR~J16393-4643 & 12.8  & 2007-04-05 08:56   & 1280  & 160 &  2MASS~J16390535-4642137 & Bodaghee et al. (2006)\\
         %\noalign{\smallskip}
            \hline
         \end{tabular}
	 \tablefoot{In the fourth column, we report  the net accumulated exposure time. Column five gives the obtained signal-to-noise ratio. The references list in the last column relates to the identification of the optical/infrared counterpart.}\vspace*{-3mm}
  \end{table}