\begin{table}%t2
\caption{\label{obphco}Photometry results for the observatories.}
\small%\centerline
{
\begin{tabular}{lrccccccrcccc}
\hline\hline\noalign{\smallskip}
Site&
Events\tablefootmark{a}&Grid miss\tablefootmark{b}&
$\Delta_{\textrm{mag}}$&
$\sigma$&
limit\tablefootmark{c}&
limit\tablefootmark{d}&
$\Delta$limi\tablefootmark{e}&
Found\tablefootmark{f}&
$H$\tablefootmark{g}&$H$\tablefootmark{h}&
$H$\tablefootmark{i}&
$H$\tablefootmark{j}\\
Code&[pcs.]&[\%]&[mag]&[mag]&[mag]&[mag]&[mag]&[pcs.]&[mag]&[mag]&[mag]&[mag]\\
\hline
644& 8274& 5.6& 0.17&0.57&19.75&19.43&0.5&186&12.1&12.9&13.5&12.4\\ 
691\tablefootmark{k}& 2611&11.1& 0.30&0.48&20.30&20.10&0.8& 35&12.4&13.4&13.5&12.9\\ 
691& 5333& 5.2& 0.34&0.44&21.07&20.96&0.1& 24&13.4&13.5&14.3&13.1\\ 
699& 9030& 2.9&-0.19&0.43&19.14&18.99&0.3&  5&12.1&12.3&12.8&11.8\\
703& 3896& 3.7& 0.17&0.54&19.79&19.53&0.4& 73&11.7&12.4&13.5&12.4\\
704&28~456& 4.6& 0.77&0.73&18.69&18.63&0.3&694&11.3&12.3&12.6&11.3\\ 
G96& 3423& 6.4& 0.06&0.42&21.19&20.94&0.3&  5&12.7&13.5&14.1&13.8\\ 
\hline
\end{tabular}}
\smallskip
\tablefoot{\tablefoottext{a}{The cumulative number of matched Trojans with magnitude on a night to night basis.}\\
\tablefoottext{b}{The number of the integrated real Trojans which did not end up in the same grid-area as the observations.}\\
\tablefoottext{c}{Median of the faintest object in fields containing real Trojans.}\\
\tablefoottext{d}{Median of the faintest object in all fictitious Trojan containing fields.}\\
\tablefoottext{e}{Difference in using all fields with fictitious Trojans and those fields which contained 10 observations or more.}\\
\tablefoottext{f}{Number of simulated discoveries.}\\
\tablefoottext{g}{Median magnitude of simulated identifications.}\\
\tablefoottext{h}{Median magnitude of real discoveries.}\\
\tablefoottext{i}{Median magnitude of the deepest magnitude for identified objects.}\\
\tablefoottext{j}{Magnitude based on \mbox{Col.~6} and a combined median distance and phase angle compensation ($-7.36$~mag).}\\
\tablefoottext{k}{Old instrument configuration.}}%\vspace{-2mm}
\end{table}