\begin{table}%T3
\caption{\label{tbl_Rtrunc}Truncation radius at the equator $R_{\rm trunc} |_{z = 0}$ in~AU of the 
different OpenSESAMe runs.}
\small
%\centering
\par
\begin{tabular}{c   c c c c c}
\hline\hline
Model & ($\cdots$,~600,~0.2) & ($\cdots$,~600,~0.5) & ($\cdots$,~1000,~0.2) & 
($\cdots$,~1000,~0.5) & ($\cdots$,~1000,~0.8) \\
\hline
SC1a & 0.263 & 0.860 & --    & 0.224 & 0.338 \\
SC1b & 0.197 & 0.691 & --    & 0.180 & 0.303 \\
SC1c & 0.175 & 0.553 & 0.071 & 0.159 & 0.252 \\
SC1d & 0.062 & 0.189 & 0.029 & 0.056 & 0.087 \\
SC1e & 0.033 & 0.101 & 0.015 & 0.030 & 0.042 \\
SC1f & 0.029 & 0.079 & 0.012 & 0.027 & 0.038 \\
SC1g & 0.006 & --    & 0.002 & 0.005 & 0.009 \\
 \noalign{\smallskip}
SC2  & 0.261 & 0.860 & --    & 0.222 & 0.337 \\
SC4  & 0.232 & 0.860 & --    & 0.235 & 0.336 \\
\hline 
Model & \multicolumn{5}{c}{($\cdots$,~100,~0.2)} \\
\hline
SC3 & \multicolumn{5}{c}{0.11} \\
\hline
\end{tabular}
\vspace*{8mm}
\end{table}