\begin{table}%t1
\caption{\label{t1}Thermal components in our model.}
%\centering
\par
\begin{tabular}{clcc}
\hline\hline
\noalign{\smallskip}
Sources &  Quiescent phase  & Bursting phase \\
\hline
SGRs  &      2 BBs  &  3 BBs \\
Transient AXPs &   2 BBs  &  3 BBs \\
Typical AXPs &   3 BBs &  3 BBs \\
\hline
\end{tabular}
\end{table}