\begin{table}%t4
\caption{\label{TabPhotomDiam}Photometric angular diameters (in mas) obtained with various synthetic spectra (with $T =$ \unit[4250]~{K}) in the 2MASS near-infrared bands.}           
\par
%\centering
\par
\begin{tabular}{l c c c}        
\hline\hline \noalign{\smallskip}               
 Model & $\phi_{J}$ & $\phi_{H}$ & $\phi_{K_{\rm s}}$ \\   
\hline    \noalign{\smallskip}                    
   Planck  & 3.00$\left(^{39}_{44}\right)$ & 3.35$\left(^{40}_{46}\right)$ & 3.22$\left(^{38}_{43}\right)$ \\     
   Engelke & 2.24$\left(^{29}_{33}\right)$ & 2.80$\left(^{34}_{39}\right)$ & 2.92$\left(^{35}_{39}\right)$ \\
   MARCS   & 2.87$\left(^{37}_{42}\right)$ & 2.78$\left(^{34}_{38}\right)$ & 2.80$\left(^{33}_{38}\right)$ \\
\noalign{\smallskip}    \hline                               
\end{tabular}
\end{table}