\begin{table}%t1
\caption{\label{t1}$F_{0}$ and $\Gamma$ during the MAGIC current observations and the previous observation.}
%\centering
\par
\begin{tabular}{lcc}
\hline\hline\noalign{\smallskip}
Observation period &  $F_{0}$ [ph~TeV$^{-1}$s$^{-1}$m$^{-2}$] &  $\Gamma$   \\ 
\hline 
March--April~2008 & $2.0\pm0.3 \times  10^{-6}$ & $-3.4\pm0.1$ \\ 
\hline 
March~2008  & $1.9\pm0.4 \times 10^{-6}$& $-3.5\pm0.2$ \\ 
\hline 
April~2008 & $2.1\pm0.4 \times  10^{-6} $ & $-3.3\pm0.2$ \\ 
\hline 
April--May~2005 +  & $1.8\pm0.3 \times  10^{-6}$  & $-4.2\pm0.3$ \\
 January--April~2006 &&\\ 
\hline
\end{tabular}
\tablefoot{The errors are statistical only. The systematic uncertainty is estimated to be 35\% in the flux level and 0.2 in the photon index (Albert et al. \cite{Albert2008a}a).}
\end{table}