\begin{table}%t7
\caption{\label{ta:mass}Properties of the clumps derived from \amm\ and the 1.2~mm continuum.} 
\par
%\centering
\par
\begin{tabular}{l l r r r r r r r r r r }
\hline\hline  \noalign{\smallskip}      
HEC name &  &\multicolumn{1}{c}{$d_{{\rm kin}}$} &\multicolumn{1}{c}{$A_{\rm V}$} & \multicolumn{1}{c}{{\it FWHM}} & \multicolumn{1}{c}{${N_{{\rm H_2}}}$}&\multicolumn{1}{c}{${n_{{\rm H_2}}}$}&\multicolumn{1}{c}{$M_{{\rm 1.2~mm}}$}& \multicolumn{1}{c}{$M_{0.25~{\rm pc}}$} &\multicolumn{1}{c}{$M_{{\rm vir}}$}& \multicolumn{1}{c}{$T_{{\rm rot}}$} &\multicolumn{1}{c}{${N_{{\rm NH_3}}}$}\\ 
        &&  \multicolumn{1}{c}{(kpc)} & \multicolumn{1}{c}{(mag)} & \multicolumn{1}{c}{(pc)} &\multicolumn{1}{c}{($10^{22}$~cm$^{-2}$)} &\multicolumn{1}{c}{($10^5$~cm$^{-3}$)} &\multicolumn{1}{c}{(${M_\odot}$)} & \multicolumn{1}{c}{(${M_\odot}$)}& \multicolumn{1}{c}{(${M_\odot}$)}  &\multicolumn{1}{c}{(K)} & \multicolumn{1}{c}{($10^{15}$~cm$^{-2}$)}\\
\hline 
G012.73-00.58.. &MM1  & 1.1& 47 & 0.11 & 4.5 & 2.8     &  12 & 22 & 6 & 9.3(0.7) & 3.7(0.8)    \\  
G013.28-00.34.. &MM1   & 4.0& 31 & 0.39 & 2.9 & 0.5    & 93 & 62 & 104 & 14.9(2.0) & 3.2(1.1)  \\
G013.91-00.51.. &MM1  & 2.7& 82 & 0.28 & 7.7 & 2.2     & 145 & 113 & 50 & 14.1(1.3) & 2.5(0.5) \\
G014.39-00.75A.. &MM1 & 2.2& 61 & 0.21 & 5.7 & 2.0      & 52 & 47 & 31 & 17.4(2.0) & 1.1(0.6)     \\
G014.39-00.75B..&MM3 & 2.5& 61 & 0.23 & 5.7 & 1.8      & 62 & 90 & 19 & 11.8(1.5) & 2.4(0.8)     \\
G014.63-00.57.. &MM1 & 2.2& 280 & 0.24 & 26.3 & 7.7    & 323 & 289 & 82 & 18.1(1.3) & 4.7(0.5)  \\
             &MM2 & 2.2& 164 & 0.15 & 15.4 & 7.3    & 72 & 80 & 26 & 15.7(1.1) & 2.7(0.4)    \\
             &MM3 & 2.1& 55 & 0.17 & 5.2 & 2.2      & 31 & 32 & 34 & 15.8(1.9) &  3.4(0.8)  \\ 
             &MM4 & 2.3& 32 & 0.18 & 3.0 & 1.2      & 21 & 26 & 12 & 19.1(5.9) & 2.0(1.1)   \\ 
G016.93+00.24.. &MM1  & 2.4& 44 & 0.27 & 4.2 & 1.1     & 64 & 53 & 23 & 14.0(1.3) &  1.7(0.3)  \\
G017.19+00.81.. &MM1 & 2.5& 52 & 0.23 & 4.9 & 1.5      & 54 & 58 & 35 & 17.2(0.9) & 2.1(0.2)   \\   
             &MM2 & 2.3& 186 & 0.20 & 17.4 & 6.3    & 142 & 156 & 35 & 18.7(1.1) & 2.1(0.2) \\
             &MM3 & 2.3& 56 & 0.25 & 5.3 & 1.5      & 72 & 108 & 45 & 20.0(1.5) & 2.6(0.3)  \\ 
             &MM4 & 2.3& 31 & 0.26 & 2.9 & 0.8      & 40 & 39 & 211 & 20.1(2.1) & 3.2(1.1)  \\
G018.26-00.24.. &MM1 & 4.7& 104 & 0.39 & 9.8 & 1.8     & 306 & 201 & 91 & 18.2(1.1) & 4.3(0.4) \\
             &MM2 & 4.7& 95 & 0.48 & 8.9 & 1.3      & 431 & 208 & 201 & 17.4(1.2) & 6.5(0.6)\\
             &MM3 & 4.7& 76 & 0.29 & 7.1 & 1.7      & 130 & 113 & 150 & 15.7(1.5) & 6.4(0.9)\\
             &MM4 & 4.7& 61 & 0.30 & 5.7 & 1.3      & 110 & 88 & 140 & 16.6(1.1) &  5.3(0.6)\\
             &MM5 & 4.6& 63 & 0.47 & 6.0 & 0.9      & 278 & 145 & 197 & 16.8(1.7) & 6.0(1.0)\\
G022.06+00.21.. &MM1 & 3.7& 270 & 0.27 & 25.4 & 6.8    & 384 & 346 & 81 & 24.7(3.3) & 4.9(0.9) \\ 
             &MM2 & 3.7& 84 & 0.24 & 7.9 & 2.4      & 92 & 74 & 36 & 15.5(1.6) &   2.6(0.5) \\
G023.38-00.12.. &MM1 & 5.6& 70 & 0.50 & 6.5 & 0.9      & 346 & 163 & 134 & 18.1(1.2) & 4.4(0.5)  \\
G024.37-00.15.. &MM1 & 3.9& 52 & 0.38 & 4.9 & 1.1      & 165 & 110 & 174 & 18.6(1.9) & 7.1(1.2)  \\
             &MM2 & 3.8& 47 & 0.30 & 4.4 & 1.2      & 94 & 74 & 70 & 15.7(1.5) & 3.8(0.7)    \\
G024.61-00.3.3. &MM1 & 3.1& 63 & 0.34 & 5.9 & 1.2      & 140 & 106 & 69 & 17.5(1.9) & 2.0(0.4)  \\
             &MM2 & 3.2& 38 & 0.31 & 3.5 & 0.8      & 72 & 49 & 21 & 15.5(1.2) &   1.5(0.2)  \\
G024.94-00.15.. &MM1 & 3.3& 69 & 0.26 & 6.5 & 2.0      & 104 & 94 & 61 & 15.2(1.0) & 3.8(0.4)    \\
             &MM2 & 3.4& 59 & 0.25 & 5.5 & 1.8      & 85 & 67 & 52 & 15.2(1.1) &  3.5(0.5)    \\
G030.90+00.00A.. &MM1 & 4.6& 55 & 0.53 & 5.2 & 0.7      & 311 & 131 & 125 & 18.6(1.7) & 3.1(0.6)\\ 
G030.90+00.00B.. &MM2 & 7.2& 61 & 0.76 & 5.8 & 0.5      & 702 & 736 & 497 & .. & ..\\
G030.90+00.00C.. &MM3 & 5.7& 46 & 0.56 & 4.3 & 0.5      & 283 & 126 & 71 & 16.4(2.4) & 3.4(0.9)\\
G030.90+00.00D.. &MM4 & 2.6& 101 & 0.21 & 9.5 & 3.2     & 49 & 95 & 22 & .. & ..\\
G034.71-00.63.. &MM1 & 3.0& 61 & 0.43 & 5.8 & 1.0      & 224 & 129 & 130 & 17.8(1.1) & 2.2(0.3)\\ 
             &MM2 & 3.0& 55 & 0.33 & 5.2 & 1.1      & 122 & 83 & 59 & 12.4(0.9) & 4.4(0.7)  \\
             &MM3 & 3.1& 26 & 0.29 & 2.5 & 0.6      & 43 & 38 & 59 & 17.1(1.9) & 1.0(0.4)   \\
G035.49-00.30A.. &MM1 & 3.6& 71 & 0.26 & 6.6 & 1.8      & 98 & 89 & 100 & 18.6(2.9) & 1.7(1.0) \\
G035.49-00.30B.. &MM2 & 3.0& 57 & 0.25 & 5.3 & 1.5      & 72 & 49 & 26 & 11.9(0.7) & 3.9(0.5)   \\
             &MM3 & 3.0& 44 & 0.38 & 4.2 & 0.8      & 127 & 81 & 102 & 13.6(0.7) & 4.3(0.4)\\
             &MM4 & 3.0& 39 & 0.26 & 3.7 & 1.0      & 54 & 36 & .. & .. & .. \\
             &MM5 & 3.0& 40 & 0.28 & 3.8 & 1.0      & 64 & 46 & .. & .. & .. \\
             &MM6 & 3.0& 36 & 0.34 & 3.3 & 0.7      & 83 & 55 & .. & .. & .. \\ 
G050.06+00.06.. &MM1 & 4.8& 47 & 0.47 & 4.4 & 0.7      & 208 & 104 & 83 & 14.9(2.2) & 2.1(0.6)\\
             &MM2 & 4.8& 49 & 0.49 & 4.6 & 0.7      & 233 & 106 & 87 & 14.1(1.7) & 1.7(0.5)\\
G053.81-00.00.. &MM1  & 1.9& 74 & 0.14 & 6.9 & 3.6     & 28 & 36 & 28 & 12.4(1.4) & 2.1(0.5)  \\
\hline                  
\end{tabular}
\tablefoot {The first two columns give the HEC name and the millimeter clump number, the~following columns represent (in~order of appearance): kinematic distance, visual extinction based on~$N_{\rm H_2}$ from the 1.2~mm emission, size at {\it FWHM}, hydrogen column density, hydrogen volume density, mass, mass within 0.25~pc diameter, virial mass, \amm\ rotational temperature, and \amm\ column density.}
\vspace*{5mm}
\end{table}