\begin{table}%t5
\caption{\label{ta:nh3}Observed ammonia parameters with uncertainties (in parenthesis) from   hyperfine and Gaussian fits with CLASS.}             
%\centering
\par
\begin{tabular}{l l r r r r r r r r}      
\hline\hline 
\noalign{\smallskip}    
HEC name && \multicolumn{4}{c}{\amm(1, 1)}& \multicolumn{2}{c}{\amm(2, 2)}& \multicolumn{2}{c}{\amm(3,3)} \\ 
       & & $V_{LSR}$&$T_{{\rm MB}}$ &  $\Delta v$ & $\tau_{{\rm main}}$ & $T_{{\rm MB}}$ & $\Delta v$& $T_{{\rm MB}}$ & $\Delta v$\\
       & &(km~s$^{-1}$)& (K)        & (km~s$^{-1}$)   &               & (K)        & (km~s$^{-1}$)& (K)        & (km~s$^{-1}$)\\
\noalign{\smallskip}
\hline 
\noalign{\smallskip}
G012.73--00.58.. &MM1  & 6.48(0.01) & 1.3(0.3) & 0.7(0.1) & 4.1(0.4) & 0.2(0.1) & 0.8(0.1) & .. & ..\\  
             &MM2  & 6.19(0.01) & 1.8(0.3) & 1.0(0.1) & 1.3(0.1) & 0.3(0.1) & 1.6(0.2) & ..&..\\   
G013.28--00.34..  &MM1 & 41.30(0.06) & 3.2(0.7) & 1.6(0.2) & 1.8(0.5) & 1.3(0.3) & 1.6(0.2) & ..&..\\
G013.91--00.51.. &MM1  & 22.94(0.02) & 2.5(0.3) & 1.3(0.1) & 1.8(0.3) & 0.8(0.2) & 1.3(0.2) & ..&..\\
G013.97--00.45..  &MM1 & 19.76(0.02) & 1.4(0.2) & 2.3(0.1) & 0.7(0.1) & 0.5(0.1) & 3.0(0.1) & 0.3(0.1) & 4.5(0.3)\\   
G014.39--00.75A.. &MM1  & 17.84(0.04) & 1.0(0.1) & 1.2(0.1) & 0.8(0.4) & 0.4(0.1) & 2.9(0.4) & 0.1(0.1) & 3.0(0.9)\\  
             &MM2  & 17.49(0.03) & 1.1(0.1) & 1.2(0.1) & 0.5(0.3) & 0.6(0.1) & 2.2(0.3) & 0.2(0.1) & 2.9(0.5)\\   
G014.39--00.75B..             &MM3  & 21.29(0.03) & 1.5(0.2) & 0.9(0.1) & 2.3(0.5) & 0.4(0.1) & 1.3(0.4) & .. & ..\\
G014.63--00.57.. &MM1  & 18.75(0.01) & 4.0(0.4) & 1.8(0.1) & 2.2(0.1) & 2.4(0.1) & 2.4(0.1) & 1.2(0.1) & 2.7(0.1)\\  
             &MM2  & 18.45(0.02) & 3.0(0.3) & 1.3(0.1) & 1.8(0.2) & 1.3(0.1) & 1.8(0.1) & 0.4(0.1) & 2.4(0.4)\\   
             &MM3  & 17.64(0.04) & 1.0(0.2) & 1.4(0.1) & 2.1(0.4) & 0.5(0.1) & 1.9(0.2) & 0.2(0.1) & 1.5(0.3)\\   
             &MM4  & 19.13(0.05) & 0.6(0.2) & 0.8(0.1) & 2.0(0.9) & 0.4(0.1) & 1.0(0.3) & .. & ..\\
G016.93+00.24.. &MM1  & 23.80(0.01) & 1.5(0.1) & 0.9(0.1) & 1.7(0.2) & 0.5(0.1) & 1.7(0.3) & .. & ..\\
G017.19+00.81.. &MM1 & 25.04(0.01) & 3.2(0.1) & 1.2(0.1) & 1.5(0.1) & 1.5(0.1) & 1.5(0.1) & 0.2(0.1) & 2.5(0.7)\\ 
             &MM2 & 22.75(0.01) & 3.1(0.1) & 1.3(0.1) & 1.3(0.1) & 1.7(0.2) & 1.6(0.1) & 0.5(0.1) & 2.3(0.3)\\ 
             &MM3 & 22.73(0.01) & 3.1(0.2) & 1.3(0.1) & 1.6(0.1) & 2.0(0.2) & 1.5(0.1) & 0.5(0.1) & 2.4(0.2)\\
             &MM4 & 21.64(0.06) & 0.5(0.1) & 2.8(0.1) & 0.9(0.3) & 0.3(0.1) & 3.6(0.3) & 0.2(0.1) & 2.6(0.4)\\
G018.26--00.24.. &MM1 & 68.07(0.01) & 2.6(0.1) & 1.5(0.1) & 2.4(0.2) & 1.6(0.1) & 2.3(0.1) & 0.6(0.1) & 2.8(0.3)\\ 
             &MM2 & 67.75(0.02) & 2.6(0.1) & 2.0(0.1) & 2.8(0.1) & 1.7(0.2) & 2.6(0.2) & 0.3(0.1) & 2.8(0.3)\\
             &MM3 & 68.32(0.01) & 3.6(0.7) & 2.2(0.1) & 2.6(0.1) & 1.8(0.1) & 2.7(0.1) & 0.6(0.1) & 3.3(0.1)\\
             &MM4 & 68.31(0.02) & 3.4(0.4) & 2.1(0.1) & 2.2(0.1) & 1.8(0.1) & 2.8(0.1) & 0.8(0.1) & 2.9(0.2)\\
             &MM5 & 66.28(0.03) & 1.9(0.2) & 2.0(0.1) & 2.6(0.2) & 1.1(0.1) & 2.0(0.2) & 0.2(0.1) & 5.0(1.1)\\
G022.06+00.21.. &MM1 & 51.17(0.02) & 1.8(0.1) & 1.7(0.1) & 1.9(0.2) & 1.5(0.1) & 2.2(0.2) & 0.5(0.1) & 3.6(0.3)\\
             &MM2 & 51.45(0.02) & 1.1(0.1) & 1.2(0.1) & 1.9(0.3) & 0.5(0.1) & 2.9(0.5) & 0.1(0.1) & 5.3(1.0)\\
G023.38--00.12.. &MM1 & 98.42(0.02) & 1.7(0.1) & 1.6(0.1) & 2.3(0.2) & 1.1(0.1) & 1.9(0.1) & 0.2(0.1) & 3.4(0.3)\\
             &MM2 & 98.86(0.02) & 1.0(0.1) & 1.1(0.1) & 1.4(0.3) & 0.5(0.1) & 1.1(0.1) & ..&..\\ 
G024.37--00.15.. &MM1 & 58.83(0.03) & 0.9(0.1) & 2.1(0.1) & 2.8(0.3) & 0.6(0.1) & 2.6(0.2) & 0.2(0.1) & 4.2(0.4)\\  
             &MM2 & 55.96(0.03) & 1.3(0.1) & 1.5(0.1) & 2.2(0.3) & 0.6(0.1) & 2.0(0.3) & 0.1(0.1) & 3.2(1.0)\\   
G024.61--00.33.. &MM1 & 42.80(0.02) & 1.3(0.1) & 1.4(0.1) & 1.2(0.2) & 0.6(0.1) & 1.5(0.2) & 0.1(0.1) & 4.9(1.1)\\ 
             &MM2 & 43.58(0.01) & 1.9(0.1) & 0.8(0.1) & 1.7(0.2) & 0.8(0.1) & 1.3(0.1) & 0.2(0.1) & 3.6(0.8)\\  
G024.94--00.15.. &MM1 & 47.10(0.01) & 2.8(0.1) & 1.5(0.1) & 2.3(0.1) & 1.3(0.2) & 1.9(0.2) & 0.4(0.1) & 2.4(0.3)\\  
             &MM2 & 48.03(0.02) & 1.8(0.1) & 1.4(0.1) & 2.2(0.2) & 0.8(0.1) & 2.1(0.2) & 0.2(0.1) & 3.7(0.7)\\  
G025.79+00.81.. &MM1 & 49.70(0.01) & 2.0(0.1) & 1.1(0.1) & 2.1(0.1) & 0.6(0.1) & 1.7(0.2) & .. & ..\\ 
             &MM2 & 49.81(0.02) & 0.9(0.2) & 0.9(0.1) & 1.3(0.4) & ..  & .. & .. & ..\\  
G030.90+00.00A.. &MM1 & 74.82(0.03) & 1.6(0.1) & 1.5(0.1) & 1.7(0.3) & 0.9(0.1) & 2.0(0.1) & 0.3(0.1) & 2.1(0.4)\\  
G030.90+00.00B..             &MM2 &109.55(0.06) & 1.4(0.1) & 2.5(0.1) & 1.9(0.3) &  ..  & .. & .. & ..\\
G030.90+00.00C..             &MM3 & 93.78(0.03) & 1.2(0.1) & 1.1(0.1) & 2.7(0.4) & 0.7(0.2) & 2.3(0.4) & 0.1(0.1) & 1.7(0.9)\\  
G030.90+00.00D..             &MM4 & 37.61(0.05) & 0.8(0.1) & 1.0(0.1) & 1.9(0.8) & .. & .. & .. & .. \\  
G034.71--00.63.. &MM1 & 44.61(0.02) & 1.7(0.1) & 1.7(0.1) & 1.1(0.1) & 0.8(0.1) & 2.2(0.2) & 0.3(0.1) & 4.4(0.3)\\  
             &MM2 & 45.43(0.02) & 1.9(0.4) & 1.3(0.1) & 3.0(0.3) & 0.6(0.1) & 1.5(0.1) & 0.2(0.1) & 6.4(0.8)\\    
             &MM3 & 46.16(0.02) & 1.1(0.1) & 1.4(0.1) & 0.6(0.2) & 0.4(0.1) & 1.3(0.2) & ..&..\\    
G034.77--00.81.. &MM1 & 43.36(0.08) & 0.6(0.1) & 1.6(0.2) & 0.5(0.7) & .. & .. & .. & .. \\ 
G034.85+00.43.. &MM1 & 55.52(0.03) & 1.1(0.3) & 0.8(0.1) & 1.8(0.5) & 0.3(0.1) & 0.8(0.1) & ..&..\\ 
G035.49--00.30A.. &MM1 & 55.23(0.06) & 0.7(0.1) & 1.9(0.1) & 0.7(0.4) & 0.3(0.1) & 2.2(0.4) & 0.2(0.1) & 4.1(0.6)\\    
G035.49--00.30B.. &MM2 & 45.31(0.01) & 2.7(0.3) & 1.0(0.1) & 3.5(0.3) & 0.8(0.1) & 1.3(0.1) & 0.1(0.1) & 2.4(1.2)\\    
             &MM3 & 45.71(0.02) & 2.1(0.1) & 1.6(0.1) & 2.5(0.2) & 0.8(0.1) & 1.6(0.1) & 0.1(0.1) & 1.9(0.7)\\    
G037.44+00.14A.. &MM1 & 18.37(0.02) & 1.3(0.2) & 0.8(0.1) & 0.6(0.3) & 0.4(2.0) & 0.5(2.2) & ..&..\\  
G037.44+00.14B..             &MM2 & 40.17(0.11) & 0.4(0.1) & 1.3(0.3) &0.5(1.1) & .. & .. & ..&..\\
G050.06+00.06.. &MM1 & 54.11(0.03) & 0.9(0.1) & 1.3(0.1) & 1.5(0.3) & 0.3(0.1) & 1.3(0.3) &  ..&..\\ 
             &MM2 & 54.53(0.03) & 0.8(0.1) & 1.3(0.1) & 1.2(0.3) & 0.2(0.1) & 3.2(0.7) &  ..&..\\ 
G053.81--00.00.. &MM1 & 24.13(0.02) & 1.3(0.1) & 1.4(0.1) & 1.3(0.2) & 0.3(0.1) & 3.1(0.9) &  ..&..\\           
\hline  
\end{tabular}
\end{table}