\begin{table}%t3
\caption{\label{ta:flux}Positions (J2000) and fluxes of the clumps from the 1.2~mm continuum data.}  
\par
%\centering
\par
\begin{tabular}{lllrrrrrrrc}
\hline\hline \noalign{\smallskip}
HEC name &  & \multicolumn{1}{c}{RA}     & \multicolumn{1}{c}{Declination} & \multicolumn{1}{c}{$F^{\rm p}$}  &\multicolumn{1}{c}{$F^i$} &\multicolumn{1}{c}{$F^i_{{\rm 0.25~pc}}$}& \multicolumn{1}{c}{Major Axis}& \multicolumn{1}{c}{Minor Axis} & \multicolumn{1}{c}{PA}& \multicolumn{1}{c}{${\rm H_2O}$\tablefootmark{a}}\\
      &   & \multicolumn{1}{c}{(h:m:s)}  & \multicolumn{1}{c}{(\degr:~\arcmin:~\arcsec)} &(mJy beam$^{-1}$)&(mJy)&(mJy)&(arcsec)& (arcsec)& (deg)&\\
\hline
G012.73--00.58... &MM1   & 18:15:41.3   & --18:12:44   &  42(8)  & 165 & 316 & 28.4 & 15.2 & 26.9  &..\\
G013.28--00.34... &MM1    & 18:15:39.9   & --17:34:37  &  59(12) & 212 & 141 & 22.7 & 17.5 & --49.6 &--\\
G013.91--00.51... &MM1    & 18:17:34.8   & --17:06:52  & 142(15) & 685  & 535 & 27.3 & 17.1 & --22.2 &--\\
G014.39--00.75A.. &MM1   & 18:19:19.0   & --16:43:49  & 142(17) & 503  & 456  & 27.1 & 14.4 & 57.1  &--\\
G014.39--00.75B..              &MM3   & 18:19:33.3   & --16:45:01   &  81(9)  & 259  & 377  & 21.5 & 16.4 &  6.7 &..\\
G014.63--00.57... &MM1   & 18:19:15.2   & --16:29:59   & 689(8)  &3111 &2.780   &  28.5 &  17.5  & 10.3      & +\\
              &MM2   & 18:19:14.3   & --16:30:41   & 332(9)  & 584  & 650  & 16.2 & 12.0 & --57.3 &..\\
              &MM3   & 18:19:02.9   & --16:30:29   & 112(11) & 269  & 276  & 21.5 & 12.3 & --42.0 &.. \\
              &MM4   & 18:19:20.5   & --16:31:42   &  86(9)  & 215  & 265  & 22.1 & 12.5 & --49.3 &..\\
G016.93+00.24... &MM1    & 18:20:50.8  & --14:06:01  &  76(11) & 357  & 296  & 27.2 & 19.1 & --80.4 &..\\
G017.19+00.81... &MM1   & 18:19:08.9   & --13:36:29   & 120(10) & 386  & 409  & 21.6 & 16.4 & 65.3 &.. \\
              &MM2   & 18:19:12.9   & --13:33:46 & 475(11) &1304 & 1430 & 17.8 & 16.9 & 87.8 & +\\
              &MM3   & 18:19:12.1   & --13:33:32  & 157(11) & 725  & 1080 & 31.3 & 16.2 & --72.9&..\\
              &MM4   & 18:19:15.2   & --13:39:29  &  87(10) & 426  & 407  & 28.2 & 19.1 & --42.0 &..\\
G018.26--00.24... &MM1   & 18:25:11.8   & --13:08:04  & 257(16) & 666  &  438 & 19.4 & 14.7 & 26.5 &--\\
              &MM2   & 18:25:06.4   & --13:08:51  & 221(17) & 887  &  429         & 31.2 & 14.2 & 30.2 &--\\
              &MM3   & 18:25:05.6   & --13:08:20  & 152(16) & 231  &  201 & 14.8 & 11.3 & --42.8  &..\\
              &MM4   & 18:25:04.5   & --13:08:27  & 133(14) & 211  &  168 & 16.7 & 10.5 & 47.7 &..\\
              &MM5   & 18:25:01.8   & --13:09:06  & 141(19) & 559  &  291 & 24.1 & 18.1 & 64.6 &..\\
G022.06+00.21... &MM1   & 18:30:34.7   &  --9:34:46  & 995(14) &2019  & 1820 & 15.6 & 14.3 & 70.6 &+\\
              &MM2   & 18:30:38.5   &  --9:34:29  & 166(15) & 259  & 208 & 14.6 & 11.8 & 64.0 &..\\
G023.38--00.12... &MM1   & 18:34:23.5   &  --8:32:20  & 171(15) & 521  & 246 & 22.3 & 15.1 & 29.1 &..\\
G024.37--00.15... &MM1   & 18:36:27.8   &  --7:40:24  & 133(12) & 529  & 350  & 26.8 & 14.4 & 33.0  &--\\
                 &MM2   & 18:36:18.3   &  --7:41:00  &  94(11) & 254  & 202  & 17.3 & 15.1 & 42.7 &+\\
G024.61--00.33... &MM1   & 18:37:23.1   &  --7:31:39  & 147(8)  & 655  & 496  & 25.3 & 19.4 & 84.2 &-- \\
                 &MM2   & 18:37:21.3   &  --7:33:07  &  75(8)  & 276  & 187  & 26.1 & 15.6 & 20.6 &--\\
G024.94--00.15... &MM1   & 18:37:19.7   &  --7:11:41   & 133(15) & 350  & 318 & 19.4 & 13.2 &--32.8 &+ \\
              &MM2   & 18:37:12.2   &  --7:11:23  & 114(15) & 278  & 218  & 19.2 & 12.4 & 23.2 &--\\
G030.90+00.00A..&MM1   & 18:47:28.9   &  --1:48:07   & 141(10) & 728  & 307 & 32.1 & 17.7 & --2.5 &.. \\
G030.90+00.00B..&MM2   & 18:47:41.9   &  --1:52:13  & 116(19) & 494  & 130 & 26.9 & 17.4 & 43.7 &-- \\
G030.90+00.00C..&MM3   & 18:47:48.2   &  --1:51:30  &  98(20) & 369  & 164 & 24.3 & 17.1 &-10.5 &-- \\
G030.90+00.00D..&MM4   & 18:47:51.5   &  --1:49:24  &  106(10) & 260   & 279 & 20.9 & 13.0 & 32.4  &..\\
G034.71--00.63... &MM1   & 18:56:48.3   &   1:18:49 & 148(9)  &1174 & 678 & 36.0 & 24.3 &  2.2  &--\\
              &MM2   & 18:56:58.2   &   1:18:44 &  79(11) & 368  & 250 & 30.2 & 17.1 &--81.7  &..\\
              &MM3   & 18:57:06.5   &   1:16:52 &  60(11) & 203  & 179 & 23.9 & 15.6 & 78.9  &--\\
G035.49--00.30A.. &MM1   & 18:57:05.2   &   2:06:29 & 180(11) & 374  & 339 & 16.8 & 13.6 &--38.8  &+\\
G035.49--00.30B.. &MM2   & 18:57:08.4   &   2:09:01 &  76(10) & 204  & 139 & 19.1 & 15.5 & 28.0 &--\\
              &MM3   & 18:57:08.1   &   2:10:47 &  73(14) & 437  & 279 & 33.3 & 19.9 & --1.6  &+ \\
              &MM4   & 18:57:09.0   &  2:08:23  &  60(10) & 178   & 118     & 24.1 & 13.5 & -1.4&..\\
              &MM5   & 18:57:06.7   &  2:08:27  & 62(10) & 211 & 154 & 26.4 & 14.3 & --28.9&..\\ 
              &MM6   & 18:57:11.5   &  2:07:27  & 55(11) & 274 & 184 & 29.0 & 19.1 & --6.1&..\\
G050.06+00.06... &MM1   & 19:23:12.4   &  15:13:35 &  89(8)  & 332  & 167 & 26.9 & 15.4 & 43.1 &--\\
              &MM2   & 19:23:09.2   &  15:12:42  &  84(9)  & 246  & 157 & 30.5 & 14.8 & 83.0 &..\\ 
G053.81--00.00... &MM1    & 19:30:55.7  &  18:29:55 & 106(11) & 226  & 291 & 16.5 & 14.3 &-50.8 &--  \\
\hline
\end{tabular}
\tablefoot {The first two columns give the HEC name and the millimeter clump number, the following columns represent (in order of appearance): right ascension, declination, 1.2~mm peak flux, integrated 1.2~mm flux, integrated 1.2~mm flux within 0.25~pc diameter, clump major axis, clump minor axis, position angle and water maser detection. \\
\tablefoottext{a}{Water maser; ``+'' means a detection, ``--'' a non-detection and ``..'' not observed.}}
\vspace*{5mm}
\end{table}