\begin{table}%t1
  %\centering
\par
  \caption{Spectroscopic parameters of \cible.
  \label{tab_fund}}
  %
 % narrow table: default is tabcolsep = 6pt
\begin{tabular}{ c  c }
\hline \hline
\T $T\ind{eff}$ & $ 6095 \pm65 $~K  \\
$\log g   $   & $ 4.00 \pm 0.06$ \\
${\rm [M/H]}$ & $+0.09 \pm 0.05$ dex \\
\B \vsini & $\rm 2.9_{-1.5}^{+1.0}$~\kms \\
\hline
\end{tabular} 
\end{table}