\begin{table}%t5
%\centering
\par
\caption{\label{tab:flux}EPIC-pn fluxes.}
\begin{tabular}{crr}
\hline\hline\noalign{\smallskip}
\multicolumn{1}{c}{Sub-band} &	
\multicolumn{1}{c}{Rev. 1482} &
\multicolumn{1}{c}{Rev. 1675} \\
\multicolumn{1}{c}{(keV)} &	
\multicolumn{1}{c}{Jan. 2008} &
\multicolumn{1}{c}{Jan. 2009} \\
\noalign{\smallskip}\hline\noalign{\smallskip}   
0.2$-$0.8   &	$\rm 1.38_{-0.01}^{+0.01}$ & $\rm 1.59_{-0.01}^{+0.01}$\vspace{1mm}\\	 
0.8$-$1.2  & $\rm    2.04_{-0.02}^{+0.02}$ & $\rm 2.48_{-0.02}^{+0.01}$\vspace{1mm}\\	      
1.2$-$8.0  & $\rm    2.06_{-0.05}^{+0.05}$ & $\rm 2.53_{-0.04}^{+0.05}$\vspace{1mm}\\	      
0.5$-$2.0  & $\rm    4.31_{-0.03}^{+0.03}$ & $\rm 5.24_{-0.04}^{+0.04}$\vspace{1mm}\\	      
3.0$-$10.0 & $\rm    0.51_{-0.02}^{+0.01}$ & $\rm 0.58_{-0.02}^{+0.02}$\vspace{1mm}\\	      
0.5$-$10.0 & $\rm    5.28_{-0.08}^{+0.05}$ & $\rm 6.40_{-0.08}^{+0.05}$\vspace{1mm}\\	      
0.2$-$10.0 & $\rm    5.51_{-0.07}^{+0.06}$ & $\rm 6.64_{-0.07}^{+0.07}$\\     
\noalign{\smallskip}\hline
\end{tabular}
\tablefoot{Fluxes in \oergcm{-12}. Errors represent 68\% confidence levels.
For the fluxes of the previous observations, see \citet{2006AetA...460..811H} and \citet{2008ApJ...676..361H}.}
\end{table}