\begin{table}%t3
%\centering
\par
\caption{\label{webtab}Models from the YSO SED model grid (Robitaille et~al. 2006), obtained using the web-based fit procedure.} 
      \begin{tabular}{cccccccrcc}
        \hline  \hline \noalign{\smallskip}
Model   & $i$       & $D$~\tablefootmark{a}    & $T_{\rm eff}$ & $R_{*}$ &  $M_{\rm env}$ &$\dot{M}_{\rm infall}$  & $\theta$~\tablefootmark{b}  & $M_{\rm disk}$ & $A_{\rm V}$\tablefootmark{c} \\  
& ($\degr$) & (kpc)  & (kK)          &(\Rsun)  &  (\Msun)       &($\Msunyr$)            &  ($\degr$)& ($\Msun$)        &  \\
\hline	\noalign{\smallskip}				     									      
3002520 & 50        &  1.0   & $23.4$        & 4.5     & $7.5 \times 10^{2}$ & $1.1\times 10^{-3}$          & 27.8      & 0.024          & 6.1  \\ 
3004217 & 18        &  4.4   &  $4.8$        & 373     & $5.0\times 10^{2}$ & $1.1\times10^{-3}$          & 2.7       & 0.0            & 9.2\\
3009737 & 50        &  4.6   & $39.8$        & 7.0     & $1.3\times10^{3}$ & $3.8~10^{-3}$          & 30.7      & 2.0            & 7.4\\ 
3003047 & 41        &  3.0   & $34.4$        & 6.6     & $5.0\times10^{3}$ & $1.0\times10^{-3}$          & 10.7      & 0.0            & 0.0\\
       \hline
      \end{tabular}
      \tablefoot{\tablefoottext{a}{The distance required to fit the SED.}
        \tablefoottext{b}{The outflow cavity opening angle.}
        \tablefoottext{c}{The applied foreground extinction.}}
    \end{table}