\begin{table}%t1
%\centering
\par
\caption{\label{tab1}Average magnitudes and colour indices of the comparison stars and var~=~TYC~2627-638-1A+TYC~2627-638-1B (measured together) from the RCC telescope.}
\par
\begin{tabular}{lllll}
\hline \hline
\noalign{\smallskip}
Star & $V$ & $B-V$ & $V-R_{\rm C}$ & $V-I_{\rm C}$\\ 
\hline
C0 &{\it  11.841} &{\it  0.582} & {\it 0.315} &{\it  0.666} \\
\hline
C1     &12.984 $\pm$ .007 & 0.677 $\pm$ .011 & 0.374 $\pm$ .010 & 0.790 $\pm$ .012 \\
       &{\it 12.986}    &{\it 0.682}     &{\it 0.383}     &{\it 0.788} \\
C2     &13.908 $\pm$ .011 & 0.849 $\pm$ .033 & 0.466 $\pm$ .016 & 0.959 $\pm$ .024 \\
       &{\it 13.921}    &{\it 0.858}     &{\it 0.480}     &{\it 0.950} \\
PSF\tablefootmark{*}&13.998 $\pm$ .022 & 0.891 $\pm$ .030 & 0.481 $\pm$ .028 & 0.976 $\pm$ .028 \\
C3     &14.364 $\pm$ .017 & 0.597 $\pm$ .047 & 0.322 $\pm$ .025 & 0.681 $\pm$ .030 \\
       &{\it 14.363}    &{\it 0.603}     &{\it 0.338}     &{\it 0.671} \\
  \hline
%var    &10.783 $\pm$ .015 &0.643 $\pm$ .021  & 0.331 $\pm$ .020 & 0.711 $\pm$ .020\\
var    &$10.799 \pm .010$ &$0.639 \pm .016$  & $0.347 \pm .015$ & $0.715 \pm .013$\\
  \hline
\end{tabular}
\tablefoot{Standard values measured by A. Henden from Jurcsik et~al. (\cite{Hanna}),  Table~1, are given in {\it italics}. C0 is used as main comparison star. 
\tablefoottext{*}{Measured separately from its companion, see text for more details.}}
\end{table}