\begin{table}%tb8
\par
\caption{\label{tab:iras12514data}Photometric data for IRAS~12514+1027.}
\small%\centering
\par
\begin{tabular}{llll}
\hline\hline\noalign{\smallskip}
$\nu$ (Hz) & $F_{\nu}$ (Jy) & Error (Jy) & Ref. \\
\hline\noalign{\smallskip}
$1.40\times10^{9}$ & $7.78\times10^{-3}$ & $1.46\times10^{-4}$ & {VLA (NED)} \\ 
$3.00\times10^{12}$ & $7.55\times10^{-1}$ & $1.51\times10^{-1}$ & {IRAS (NED)} \\ 
$5.00\times10^{12}$ & $7.12\times10^{-1}$ & $5.70\times10^{-2}$ & {IRAS (NED)} \\ 
$1.20\times10^{13}$ & $1.90\times10^{-1}$ & $1.58\times10^{-2}$ & {IRAS (NED)} \\ 
$2.50\times10^{13}$ & $6.32\times10^{-2}$ & ... & {IRAS (NED)} \\ 
$5.23\times10^{13}$ & $3.46\times10^{-2}$ & $4.03\times10^{-3}$ & {\Spitzer-IRAC} \\ 
$8.44\times10^{13}$ & $1.49\times10^{-2}$ & $4.82\times10^{-3}$ & {\Spitzer-IRAC} \\ 
$1.39\times10^{14}$ & $2.57\times10^{-3}$ & $1.26\times10^{-4}$ & {2MASS} \\ 
$1.80\times10^{14}$ & $8.45\times10^{-4}$ & $8.57\times10^{-5}$ & {2MASS} \\ 
$2.43\times10^{14}$ & $4.07\times10^{-4}$ & $5.40\times10^{-5}$ & {2MASS} \\ 
$3.33\times10^{14}$ & $2.88\times10^{-4}$ & $7.96\times10^{-5}$ & {SSS} \\ 
$3.28\times10^{14}$ & $5.66\times10^{-4}$ & $1.15\times10^{-5}$ & {SDSS-DR5} \\ 
$3.93\times10^{14}$ & $3.39\times10^{-4}$ & $2.96\times10^{-6}$ & {SDSS-DR5} \\ 
$4.28\times10^{14}$ & $2.46\times10^{-4}$ & $6.81\times10^{-5}$ & {SSS} \\ 
$4.81\times10^{14}$ & $2.82\times10^{-4}$ & $2.30\times10^{-6}$ & {SDSS-DR5} \\ 
$6.28\times10^{14}$ & $1.16\times10^{-4}$ & $1.50\times10^{-6}$ & {SDSS-DR5} \\ 
$6.81\times10^{14}$ & $5.78\times10^{-5}$ & $2.13\times10^{-5}$ & {SSS} \\ 
$8.47\times10^{14}$ & $4.79\times10^{-5}$ & $3.53\times10^{-6}$ & {SDSS-DR5} \\ 
 \hline 
\end{tabular} 
\end{table}