\begin{table}%ta.1
%\centering
\par
\caption{\label{formaltest_table1}Input parameters for nine synthetic models (IN) are compared to the actual (interpolated and best-fit model) output parameters (OUT) obtained through the application of AnalyseBstar to these synthetic data (see text for further explanation and notes to this table for the meaning of the symbols).}
\includegraphics[width=20cm]{tabA1.eps}
\end{table}