\begin{table}%t1
\par
%\centering
\par
\caption{\label{quiescence}Fit parameters to the quiescent spectra before and after the flare.}
\begin{tabular}{lccc}
\hline\hline
\noalign{\smallskip}
& Before the flare & \multicolumn{2}{c}{After the flare}\\
\hline
Exposure time [s]			&3004			&\multicolumn{2}{c}{5046}\\
$kT_1$ [keV]				&$0.14\pm0.01$		&$0.19\pm0.01$	&$0.13\pm0.01$\\
$EM_1$ [10$^{50}$ cm$^{-3}$]		&$\rm 0.16^{+0.03}_{-0.02}$	&$0.21\pm0.01$	&$0.16\pm0.02$\\[0.5mm]
$kT_2$ [keV]				&$\rm 0.40^{+0.09}_{-0.02}$ &$0.58\pm0.02$  &$0.34\pm0.01$\\[0.5mm]
$EM_2$ [10$^{50}$ cm$^{-3}$]		&$\rm 0.21^{+0.02}_{-0.04}$ &$0.13\pm0.01$  &$\rm 0.22^{+0.01}_{-0.02}$\\[0.5mm]
$kT_3$ [keV]				&--			&--		&$\rm 1.11^{+0.19}_{-0.18}$	\\[0.5mm]
$EM_3$ [10$^{50}$ cm$^{-3}$]		&--			&--		&$0.04\pm0.01$\\
red. $\chi^2$				&1.05			&1.40		&1.05\\
d.o.f.					&96			&149		&147\\
$\log L_{\rm X}$ [0.2--5.0~keV]	&26.78			&26.77		&26.80\\
\hline
\end{tabular}
\end{table}