\begin{table}%t3
%\centering
\par
\caption{\label{tab:spitzer}Photometry of possible infrared counterparts to the LABOCA sources.}
  \begin{tabular}[t]{l c c c c c c c c}
    \hline \hline \noalign{\smallskip}
Source & $\alpha(J2000)$ & $\delta(J2000)$ &  $d_{{\rm LABOCA}}$\tablefootmark{a} & $S_{{\rm 3.6
~\mu m}}$ & $S_{{\rm 4.5 ~ \mu m}}$ & $S_{{\rm 5.8~\mu m}}$  & $S_{{\rm 8.0~\mu m}}$ & $S_{{\rm 24~\mu m}}$ \\
 & (h:m:s)  & ($^\circ:':''$) & (\arcsec) & ($\mu$Jy) &  ($\mu$Jy) &
    ($\mu$Jy) & ($\mu$Jy)  & ($\mu$Jy) \\
    \hline
    2 & 06:58:24.59 & --55:55:12.2 &   1.1 & $ 71.2 \pm   0.3$ & $ 99.5
    \pm 0.5$ & $ 77.8 \pm   1.6$ & $ 53.1 \pm   1.9$ & $507.5 \pm  20.5$  \\ 
    5 & 06:58:27.17 & --56:01:16.8 &   1.0 & $ 12.1 \pm   0.2$ & $ 15.1
    \pm   0.3$ & < 19.9  & $ 24.9 \pm   1.5$ & $249.6 \pm  24.3$  \\ 
    6 & 06:58:28.92 & --55:53:52.0 &   3.6 & $ 13.7 \pm   0.4$ & $  8.8
    \pm   0.5$ & < 6.0 & < 2.0 & < 40 \\ 
    7 & 06:59:00.72 & --55:52:21.9 &   6.8 & $ 89.2 \pm   0.2$ & $ 54.6
    \pm   0.4$ & $ 26.8 \pm   1.5$ & < 18.7 & < 40 \\ 
    8 & 06:58:23.96 & --55:57:19.5 &   3.6 & $ 55.7 \pm   0.6$ & $ 68.5 \pm   0.6$ & $ 50.1 \pm   1.5$ & $ 40.5 \pm   1.5$ & $582.3 \pm  24.4$  \\ 
    10 & 06:58:45.39 & --55:58:46.4 &   2.3 & $ 17.5 \pm   0.7$ & $
    23.7 \pm   0.7$ & $ 28.2 \pm   1.9$ & < 18.4 & $608.0 \pm  39.0$ \\ 
    11 & 06:58:53.52 & --56:00:48.4 &   4.3 & $ 33.4 \pm   0.4$ & $ 47.0 \pm   0.4$ & $ 72.2 \pm   2.2$ & $ 88.5 \pm   1.6$ & $228.8
    \pm  33.5$ \\ 
    15 & 06:58:34.14 & --55:54:37.2 &   5.3 & $ 46.1 \pm   0.3$ & $
    37.2 \pm   0.4$ & $ 37.4 \pm   1.4$ & $ 30.1 \pm   2.1$ & $301.3 \pm  15.5$  \\ 
    \hline
  \end{tabular}
  \tablefoot{\tablefoottext{a}{Distance between the IRAC 1 position
    and the central LABOCA position.}}
  \end{table}