\begin{table}%t3
\caption{\label{tab:UIR}UIR band strength ratio relative to the 11.3~$\mu$m band.}
%\centering
\par
\begin{tabular}{l c c }
\hline
\hline\noalign{\smallskip}
              Band & Filament & Disk   \\
\hline
  6.2~$\mu$m  & $0.94\pm0.29$ & $0.71\pm0.08$ \\
  7.7~$\mu$m  & $1.45\pm0.31$ & $3.54\pm0.21$ \\
  8.6~$\mu$m  & ...\tablefootmark{a} & $1.37\pm0.13$ \\
\hline
\end{tabular}
\tablefoot {\tablefoottext{a}{The 8.6~$\mu$m band is not included in the fit.}}
\end{table}