\begin{table}%t2
\caption{\label{tab:table_2}Some fits for the Newtonian constant M/L ratio and the MOND isotropic ($\beta_*=0$) and anisotropic  ($\beta_*\neq 0$) modeling.}
%\centerline
{
\small\begin{tabular}{lcrrl}
\hline\hline
\noalign{\smallskip}
%\multicolumn{1}{c}{radial bin} &
\multicolumn{1}{c}{Model} &
\multicolumn{1}{c}{Region} &
\multicolumn{1}{c}{$M/L_B$} &
\multicolumn{1}{c}{$\beta_*$} &
\multicolumn{1}{c}{$\chi^2$} \\
\multicolumn{1}{c}{(1)} &
\multicolumn{1}{c}{(2)} &
\multicolumn{1}{c}{(3)} &
\multicolumn{1}{c}{(4)} &
\multicolumn{1}{c}{(5)} \\
\hline
Newtonian	  &  1 	  &6.24  &  0.00   & 0.93   \\
Newtonian	  &  1	  &7.00  &  0.00   & 0.47   \\
Newtonian	  &  2 	  &6.24  &  0.00   & 3.62   \\
Newtonian	  &  2	  &8.00  &  0.00   & 3.32 * \\ 
Newtonian	  &  2	  &16.00 &  0.00   & 22.61* \\  
%fig 2
Newtonian	  &  1	  & 6.24 &  --0.10  & 0.58   \\ 
Newtonian	  &  1	  & 7.50 &   0.10  & 0.44   \\
Newtonian	  &  2	  & 6.24 &  --0.10  & 3.26   \\ 
Newtonian	  &  2	  & 6.24 &  --0.50  & 6.09*  \\
%fig 3 & fig 4
%simple
MOND ``simple''	  &  1	  &9.75  &  0.00   & 0.32   \\
MOND ``simple''	  &  2	  &9.00  &  0.00   & 13.66   \\
MOND ``simple''	  &  1	  &6.24  &  --0.60  & 0.07   \\
MOND ``simple''	  &  1	  &7.00  &  --0.40  & 0.14   \\
MOND ``simple''	  &  2	  &9.00  &  --0.50  & 4.37   \\
%standard
MOND ``standard'' &  1	  &7.00  &  0.00   & 0.71   \\
MOND ``standard'' &  1	  &8.00  &  0.00   & 0.02  \\
MOND ``standard'' &  2	  &9.00  &  0.00   & 10.05   \\
MOND ``standard'' &  1	  &6.24  &  --0.30  &  0.05  \\
MOND ``standard'' &  1	  &7.00  &  --0.20  &  0.01  \\
MOND ``standard'' &  2	  &6.24  &  --0.50  &  5.02  \\
% toy
MOND ``toy''	  &  1	  &12.50 &  0.00   & 0.44  \\
MOND ``toy''	  &  1	  &7.00  & --0.60   & 0.48   \\
MOND ``toy''	  &  2    &6.24  &  --0.50  & 9.75   \\
MOND ``toy''	  &  2	  &9.00 & --0.50   & 6.10   \\
\hline
\end{tabular}}
\tablefoot{Column (1):  the name of the model; 
Col. (2): region for which the fit is calculated; ''1'' is for the innermost region ($r\le 10$~arcmin) and ''2'' is for the outer region ($r>10$~arcmin);
Col. (3): mass-to-light ratio in the $B$-band used;
Col. (4): the best-fitting value of the $\beta_*$ parameter;
Col.~(5):
reduced $\chi^2$ of the fit for a given model (see text for details).}\vspace*{-1.5mm}
\end{table}