\begin{table}%t2
\caption{\label{mag}NGC 4388 photometry.}
%\centering
\small
\begin{tabular}{ccccccccccc}
\hline\hline
 Filter &  $FUV$  &$NUV$  & $u'$   & $g'$   & $r'$    & $i'$    & $z'$  & $J$    & $H$  & $K$  \\
\hline
$m$   &    $-$ &  $-$   &16.78 &15.06 &14.35 &14.69 &14.07 &13.08 &12.65 &12.52\\
$\sigma_{\rm star}$        & $-$ & $-$ & 0.025   & 0.034 & 0.017  & 0.002 & 0.016  & 0.021 & 0.03    & 0.024  \\
Inner &   20.40     & 19.95   &18.45 &17.10 &16.37 &16.03 &15.76 &14.38 &13.60 &13.32\\
$\sigma_{\rm SLIT}$-Inner &0.17& 0.04&0.01    &0.02   &0.04   &0.04   &0.04    &0.04   &0.02    &0.05  \\
Outer & 22.21      &  21.30  &19.49 &18.07 &17.47 &17.18 &17.03 &16.08 &15.06 &14.75 \\
$\sigma_{\rm SLIT}$-Outer&0.31&0.07&0.08&0.06   &0.07    &0.07   &0.03   &0.33   &0.04    &0.12   \\
\hline
$\sigma_{\rm TOT}$-Inner &0.2 & 0.1 &0.03  &0.04   &0.04   &0.04   &0.04   &0.05   &0.04    &0.06  \\
\hline
$\sigma_{\rm TOT}$-Outer &0.33& 0.12&0.07  &0.07   &0.07   &0.07   &0.03   &0.33   &0.05    &0.12  \\
\hline
\end{tabular}
\end{table}