\begin{table}%t5
%\centering
\par
\caption{\label{IOMC:fittable2}Light curve solutions based on the OAN photometry, for an overcontact and semi-detached configuration.}
\par
\begin{tabular}{l c c }
\hline\hline \noalign{\smallskip}
 Parameter & Overcontact (adopted)  & Semi-detached      \\
\hline\noalign{\smallskip}
$i$ ($^{\circ}$)           &    $\rm 65.2^{+2.0}_{-3}$           &     $\rm 62.90^{+2.20}_{-0.10}$           \\
$T_{\rm eff,2}$ (K)                &        $\rm 5543^{+500}_{-24}$    &   $\rm 5724_{-25}^{+160}$         \\
$\log g_1$               &  $\rm 4.38_{-0.06}^{+0.05}$           &    $\rm 4.423_{-0.070}^{+0.015}$    \\
$\log g_2$               &  $\rm 4.36_{-0.05}^{+0.06}$           &   $\rm 4.40_{-0.07}^{+0.04}$        \\
$\Omega_1$               &    $\rm 3.37_{-0.05}^{+0.06}$         &    $3.43 \pm 0.08$            \\
$\Omega_2$               &    $\Omega_1$                     &    $\rm 3.397_{-0.030}^{+0.018}$           \\
$L_1/(L_1+L_2+L_3)_B$  &     $0.71 \pm 0.09$          &    $0.685 \pm 0.006$         \\
$L_1/(L_1+L_2+L_3)_V$  &     $0.680 \pm 0.029$        &    $0.66 \pm 0.05$              \\
$L_1/(L_1+L_2+L_3)_I$  &     $0.6272 \pm 0.0016$      &    $0.613 \pm 0.016$            \\
${\ell}_{3~ B}$\tablefootmark{a}   &     $0.035 \pm 0.018$           &    $0.0263 \pm 0.0027$                \\
${\ell}_{3~ V}$                 &                      $0.0399 \pm 0.0006$         &    $0.031 \pm 0.009$         \\
${\ell}_{3~ I}$                  &                      $0.0489 \pm 0.0011$         &    $0.037 \pm 0.003$        \\
${\rho}_{\rm pole~1}$\tablefootmark{b}  &    $0.38 \pm +0.05$        &  $0.37 \pm 0.05$     \\
${\rho}_{\rm point~1}$ &          --                  &  $0.52 \pm 0.05$                      \\
${\rho}_{\rm side~1}$ &   $0.40 \pm 0.05$     &  $0.39 \pm 0.05$                     \\
${\rho}_{\rm back~1}$ &   $0.44 \pm 0.05$    &  $0.42 \pm 0.05$                     \\
$R_1$ ($R_{\odot}$)\tablefootmark{c} & $\rm 1.22_{-0.03}^{+0.05}$      &   $1.190 \pm 0.005$           \\
${\rho}_{\rm pole~2}$ &     $0.35 \pm 0.05$  &   $0.34 \pm 0.05$                  \\
${\rho}_{\rm point~2}$ &        --                    &   --                               \\
${\rho}_{\rm side~2}$ &    $0.36 \pm 0.05$   &   $0.36 \pm 0.05$              \\
${\rho}_{\rm back~2}$ &    $0.40 \pm 0.05$   &   $0.39 \pm 0.05$              \\
$R_2$ ($R_{\odot}$) &    $\rm 1.11^{+0.05}_{-0.03}$    &   $\rm 1.10_{-0.01}^{+0.02}$     \\
$M_{\rm bol 1}$~(mag) &  $\rm 3.81^{+0.18}_{-0.21}$ &     $3.86 \pm 0.12$               \\
$M_{\rm bol 2}$~(mag) &  $\rm 4.69_{-0.50}^{+0.08}$  &    $\rm 4.57_{-0.16}^{+0.04}$        \\
\multicolumn{3}{c}{Spot parameters}   \\
Colatitude$_{2}$~(deg)      & $20$           &  $20$              \\
Longitude$_{2}$~(deg)       & $\rm 120.0^{+8}_{-0.5}$  &  $\rm 135.2^{+1.2}_{-29}$     \\
Radius$_{2}$~(deg)          & $\rm 57^{+47}_{-10}$    &  $74_{-23}^{+12}$                \\
$T_{\rm spot}$$_{2}$/$T_{\rm surface}$$_{2}$   &   $0.80$        &  $0.80$               \\
\hline
$\sqrt{{\Sigma}{\Delta}{\sigma}^{2} {(V)}/N}$       &  $0.001136$           &   $0.001240$  \\
$\sqrt{{\Sigma}{\Delta}{\sigma}^{2} {(B)}/N}$       &  $0.000910$           &   $0.001006$  \\
$\sqrt{{\Sigma}{\Delta}{\sigma}^{2} {(I)}/N}$        &  $0.002939$           &   $0.003108$  \\
\hline
\end{tabular}
\tablefoot{\tablefoottext{a}{Third-light values at phase 0.25.}
\tablefoottext{b}{Relative radii in different directions, in units of the semi-major axis.} \tablefoottext{c}{Volume radius, defined as the radius of a sphere with the same volume as the limiting Roche lobe.}}
\end{table}