\begin{table}%T4
\caption{\label{Table other lines}Results from light curves of emission lines other than H~{\sc i} Lyman-$\alpha$.}
\small%\centering
\par
\begin{tabular}{cccccccc}
\hline
\hline
\noalign{\smallskip}
Line & $\lambda$ & $N$        & $\chi^2$ & Degree of & Absorption  & $\sqrt{\Delta \chi^2}$ & 3-$\sigma$ upper limit  \\
     & (\AA) & measurements &          &  freedom  & (\%) &  from 2.4\% abs.   & (\%)  \\
\hline
O{\sc i}    & 1305  &  87  &  80.5  & 80 &  3.7 $\pm$ 2.4  &  0.5 & 11.1 \\
C{\sc ii}   & 1335  &  88  &  80.7  & 81 &  1.0 $\pm$ 1.0  &  1.3 &  5.5  \\
S{\sc iv}   & 1400  &  86  &  79.6  & 79 &  1.6 $\pm$ 1.6  &  0.8 & 11.2 \\
C{\sc iv}   & 1550  &  86  &  94.1  & 79 &  1.7 $\pm$ 1.7  &  0.5 &  7.0 \\
C{\sc i}    & 1660  &  84  &  66.2  & 77 &  0.7 $\pm$ 0.7  &  1.5 &  6.2 \\
\hline
\end{tabular}
\end{table}