\begin{table}%T2
%\centering
$$
\begin{tabular}{c c c c}
Model & CPL~& $\Gamma=1$ & $\Gamma=0.85$ \\
\hline
f.o.m. & $2.03$ & $1.54$ & $2.11$ \\
\end{tabular}
$$
\end{table}