\begin{table}%t2
\caption{\label{tab:fitranges}Radial ranges used for fitting NFW profiles to the lensing and X-ray
data, with all radii expressed in units of $r_{200}$ reported in Table~1.}
\small%\centering
\par
\begin{tabular}{lcccccccc}
\hline
\hline\noalign{\smallskip}
Cluster & Min-max SL &  Min-max WL & Min-max SL+WL & Min-max X-ray\\
\hline
$g1 - x$  & 0.002--0.08 & 0.16--1.00 & 0.03--1.00 & 0.45--0.90\\
$g1 - y $ & 0.002--0.09 & 0.16--1.00 & 0.03--1.00 & 0.45--0.90\\
$g1 - z$  & 0.002--0.06 & 0.16--1.00 & 0.03--1.00 & 0.45--0.90\\
$g51 - x $ & 0.003--0.07 & 0.20--1.00 & 0.05--1.00 & 0.50--1.00\\
$g51 - y$  & 0.002--0.05 & 0.20--1.00 & 0.05--1.00 & 0.50--1.00\\
$g51 - z$  & 0.002--0.12 & 0.20--1.00 & 0.05--1.00 & 0.50--1.00\\
$g72 - x$  & 0.006--0.05 & 0.20--1.00 & 0.05--1.00 & 0.54--1.08\\
$g72 - y$ & 0.006--0.05 & 0.20--1.00 & 0.05--1.00 & 0.54--1.08\\
$g72 - z$ & 0.002--0.05 & 0.20--1.00 & 0.05--1.00 & 0.54--1.08\\
\hline  
\end{tabular}
\end{table}