\begin{table}%t2
\par
%\begin{center}
\par
\caption{\label{tab:basis}The target electron configuration basis (13C) and orbital scaling parameters.}
\begin{tabular}{lll|lll} %l
\hline\hline
%\noalign{\smallskip}
\multicolumn{3}{c}{Configurations} &    \multicolumn{3}{|l}{Scaling parameters\tablefootmark{\dagger}} \\
 &    even             &       odd             &     &         &    \\
\hline%\\[-3.2mm]
%
 & 3s$^2$~3p$^4$  & 3s~3p$^5$         &     &     1s  & 1.4177 \\
 & 3p$^6$     &                         &     &     2s  & 1.1233 \\
 & 3s~3p$^4$~3d & 3s$^2$~3p$^3$~3d     &     &  2p  & 1.0655 \\
 &                & 3p$^5$~3d          &     &     3s  & 1.1585 \\
 & 3s$^2$~3p$^2$~3d$^2$ & 3s~3p$^3$~3d$^2$  &     &     3p  & 1.1295 \\
 &                        &     3s$^2$~3p~3d$^3$            &     &     3d  & 1.1539 \\
 &    &  3s$^2$~3p$^3$~4s     &     &      4s   &  1.1827  \\
 &    &  3s$^2$~3p$^3$~4d     &     &      4d   &  1.1332  \\
 &    &  3s$^2$~3p$^2$~3d~4p     &     &   4p      &  1.1593  \\
 &    &  3s$^2$~3p$^2$~3d~4f     &     &   4f      &  1.2877  \\
\hline
\end{tabular}%\end{center}
\par
\vspace*{-4mm}
%\tablefoottext{$^\dagger$}
%\tablefoot{$^\dagger$}
\tablefoot{\tablefoottext{\dagger}{See text for the physical significance of the scaling parameters.}}\vspace*{-3mm}
\par
\end{table}