\begin{table}%t1
\caption{\label{allcilines}Lines considered for the abundance determination.}
\small%\centering
\par
\begin{tabular}{rccrc} 
\hline\hline\noalign{\smallskip} 
$\lambda$ & Quality && $\lambda$ & Quality\\
nm & && nm & \\
 \hline 
  477.000~~   & 3 && 1165.968  & 3 \\ 
  477.5907    & 2 && 1174.822     & 2 \\
  505.2167    & 1 && 1177.754     & 1 \\
  538.0336    & 1 && 1180.110     & 3 \\
  658.7608    & 2 && 1184.873     & 1 \\
  708.5511    & 3 && 1186.299     & 1 \\
  708.7827    & 2 && 1189.291     & 1 \\
  711.1475    & 2 && 1189.575     & 1 \\
  711.3180    & 1 && 1254.948     & 2 \\
  713.2112    & 3 && 1256.212     & 1 \\ 
  783.7105    & 2 && 1256.904     & 1 \\
  801.8564    & 1 && 1258.159     & 1 \\
  833.5149    & 1 && 1261.410     & 3 \\
  872.7126    & 2 && 1602.164     & 3 \\
  875.3079    & 3 && 1704.516     & 3 \\
  887.3390    & 3 && 1723.448     & 3 \\
  906.1432    & 1 && 1734.638     & 2 \\
  907.8278    & 1 && 1744.860     & 1 \\
  911.1797    & 1 && 1745.597     & 1 \\
  918.2831    & 3 && 1747.591     & 3 \\
  960.3032    & 2 && 1750.564     & 1 \\
  962.0795    & 3 && 1755.446     & 3 \\
  965.8435    & 1 && 1763.738     & 2 \\
 1012.3871    & 1 && 1778.960     & 2 \\
 1054.1241    & 2 && 2102.313     & 2 \\
 1068.5345    & 1 &&  2121.155     & 2  \\
 1070.7333    & 1 &&  2125.989     & 2\\
 1072.9533    & 1 && 2290.656     & 2\\
 1075.3985    & 1 && 3085.462     & 3  \\
 1161.929~~   & 3 &&  3129.748     & 2 \\
 1163.050~~   & 3 && 3406.579     & 3\\
 1165.884~~   & 3 &&  3991.177     & 3 \\
 \hline\end{tabular}
\tablefoot{Quality: 1 good line, 2 line with problems, 3 line rejected.}
\end{table}