\begin{table}%t2
\par
	\caption{\label{table:2}Parameters of the \KI\ components in IRC+10216.} 
                %\centering

	\begin{tabular}{cccc}
	\hline
	\hline
	\noalign{\smallskip}
Component    &  Strength    &  $b$   &     $V_{\rm r}$   \\
             &   (rel.)     & (\kms) &      (\kms)   \\
	\hline
 1   &   0.27  &   2.8   &  $-$32.4  \\ 
 2   &   0.32  &   2.9   &  $-$28.0  \\
 3   &   1.00  &   5.5   &  $-$21.0  \\
 4   &   0.51  &   3.9   &  $-$09.2  \\
 \hline
 \end{tabular}
\end{table}