\begin{table}%t1
     \caption{\label{results}Photometry, $Af\rho$, and colours of the comet C/2007 D1 (LINEAR).}
     %\centering
\par
     \renewcommand{\footnoterule}{}			
     \begin{tabular}{c c c c c c c c}
     \hline\hline
     \noalign{\smallskip}
      $\phi$ [$^{\prime\prime}$]\tablefootmark{a} & log$_{10}\rho$ [km]\tablefootmark{b} & {\it V} & {\it R} & $V-R$ & $Af\rho$ 
      [cm]\tablefootmark{c} & $Af\rho$ [cm]\tablefootmark{d} & Reddening [\%/1000 $\AA$] \\
     \hline
     0.5 & 3.531 & 21.723 $\pm$ 0.123 & 21.008 $\pm$ 0.092 & ... & ... & ... & ... \\
     1.1 & 3.832 & 20.468 $\pm$ 0.072 & 19.861 $\pm$ 0.060 & 0.607 $\pm$ 0.132 & 1400 $\pm$ 93 & 
     1774 $\pm$ 97 & 1.91 $\pm$ 1.12 \\
     2.2 & 4.133 & 19.493 $\pm$ 0.049 & 18.988 $\pm$ 0.044 & 0.505 $\pm$ 0.093 & 1719 $\pm$ 78 & 
     1983 $\pm$ 81 & 1.19 $\pm$ 0.80 \\
     3.3 & 4.309 & 19.057 $\pm$ 0.042 & 18.584 $\pm$ 0.039 & 0.473 $\pm$ 0.080 & 1712 $\pm$ 65 & 
     1917 $\pm$ 68 & 0.98 $\pm$ 0.67 \\
     \hline
     Sun &       &                    &                    & 0.35\tablefootmark{e} &  &      \\
     \hline
     \end{tabular}
{\bf Notes.} \tablefoottext{a}{Radius of the photometry aperture.}   
\tablefoottext{b}{Linear radius of the aperture at the comet.}     			\tablefoottext{c}{In the {\it V} filter.}  
\tablefoottext{d}{In the {\it R} filter.}	
\tablefoottext{e}{Colour of the Sun is in the modern Johnson-Cousin system used by Landolt (\cite{Land}) (from Holmberg, Flynn \& Portinari \cite{HFP06}).}
\end{table}